b(E) × 10^{6} [cm^{2}g^{−1}] for dimethyl sulfoxide (CH_{3})_{2}SO

⟨Z/A⟩ = 0.53757

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 0.3851 0.1751 0.4588 1.0191
5. 0.5232 0.4308 0.4865 1.4404
10. 0.6363 0.6424 0.4727 1.7514
20. 0.7545 0.8690 0.4515 2.0750
50. 0.9134 1.1901 0.4281 2.5317
100. 1.0305 1.4145 0.4168 2.8618
200. 1.1406 1.6147 0.4110 3.1663
500. 1.2700 1.8280 0.4102 3.5082
1000. 1.3520 1.9474 0.4167 3.7162
2000. 1.4193 2.0342 0.4278 3.8812
5000. 1.4855 2.1093 0.4484 4.0432
10000. 1.5203 2.1448 0.4692 4.1342
20000. 1.5450 2.1672 0.4936 4.2057
50000. 1.5653 2.1850 0.5318 4.2821
100000. 1.5749 2.1923 0.5646 4.3318