b(E) × 10^{6} [cm^{2}g^{−1}] for

dichlorodiethyl ether C_{4}Cl_{2}H_{8}O ⟨Z/A⟩ = 0.51744

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 0.4134 0.1899 0.4531 1.0564
5. 0.5620 0.4669 0.4806 1.5095
10. 0.6835 0.6942 0.4672 1.8450
20. 0.8102 0.9364 0.4466 2.1932
50. 0.9799 1.2801 0.4239 2.6840
100. 1.1047 1.5197 0.4128 3.0372
200. 1.2217 1.7409 0.4073 3.3698
500. 1.3588 1.9590 0.4066 3.7243
1000. 1.4454 2.0840 0.4131 3.9426
2000. 1.5161 2.1752 0.4240 4.1153
5000. 1.5854 2.2538 0.4443 4.2836
10000. 1.6217 2.2909 0.4647 4.3773
20000. 1.6474 2.3143 0.4887 4.4505
50000. 1.6683 2.3331 0.5263 4.5276
100000. 1.6782 2.3407 0.5584 4.5773