b(E) × 10^6 [cm^2g^{−1}] for deuterium oxide (liquid) (D_2O) ⟨Z/A⟩ = 0.49931

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2720 0.1185 0.4777 0.8682 5. 0.3695 0.2943 0.5055 1.1693 10. 0.4506 0.4475 0.4899 1.3880 20. 0.5364 0.6141 0.4667 1.6173 50. 0.6538 0.8485 0.4413 1.9436 100. 0.7413 1.0141 0.4289 2.1843 200. 0.8254 1.1669 0.4224 2.4146 500. 0.9247 1.3248 0.4214 2.6709 1000. 0.9887 1.4218 0.4279 2.8385 2000. 1.0422 1.4904 0.4393 2.9720 5000. 1.0961 1.5511 0.4608 3.1081 10000. 1.1251 1.5798 0.4827 3.1877 20000. 1.1459 1.5978 0.5085 3.2522 50000. 1.1640 1.6120 0.5489 3.3248 100000. 1.1728 1.6177 0.5836 3.3743