b(E) × 10^{6} [cm^{2}g^{−1}] for

curium (Cm), Z = 96, A =[247.07035(3)]

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 2.1932 0.2469 0.3568 2.7968
5. 3.0504 1.9677 0.3807 5.3988
10. 3.7512 3.3077 0.3734 7.4322
20. 4.4705 4.5305 0.3602 9.3613
50. 5.4105 6.4119 0.3456 12.1680
100. 6.0774 7.6490 0.3386 14.0650
200. 6.6841 8.7410 0.3354 15.7606
500. 7.3620 9.7370 0.3356 17.4346
1000. 7.7679 10.2624 0.3408 18.3711
2000. 8.0821 10.6399 0.3490 19.0710
5000. 8.3719 10.9548 0.3638 19.6904
10000. 8.5145 11.0996 0.3786 19.9926
20000. 8.6085 11.1941 0.3957 20.1983
50000. 8.6925 11.2641 0.4225 20.3791
100000. 8.7202 11.2932 0.4455 20.4589