b(E) × 10^{6} [cm^{2}g^{−1}] for cesium fluoride (CsF) ⟨Z/A⟩ = 0.42132

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.2915 0.4882 0.3881 2.1679
5. 1.7810 1.4610 0.4141 3.6561
10. 2.1794 2.2166 0.4053 4.8014
20. 2.5885 2.9458 0.3856 5.9200
50. 3.1258 4.0359 0.3733 7.5350
100. 3.5097 4.7638 0.3652 8.6386
200. 3.8623 5.4151 0.3612 9.6387
500. 4.2616 6.0192 0.3612 10.6420
1000. 4.5045 6.3433 0.3670 11.2148
2000. 4.6953 6.5779 0.3760 11.6493
5000. 4.8743 6.7752 0.3926 12.0421
10000. 4.9639 6.8668 0.4092 12.2399
20000. 5.0238 6.9265 0.4285 12.3787
50000. 5.0735 6.9712 0.4586 12.5033
100000. 5.0959 6.9901 0.4843 12.5703