b(E) × 10^{6} [cm^{2}g^{−1}] for

cerium (Ce), Z = 58, A =140.116(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.4992 0.5391 0.3769 2.4152
5. 2.0698 1.6772 0.4026 4.1496
10. 2.5344 2.5592 0.3946 5.4882
20. 3.0111 3.4034 0.3751 6.7897
50. 3.6362 4.6705 0.3643 8.6710
100. 4.0822 5.5140 0.3566 9.9528
200. 4.4911 6.2672 0.3530 11.1112
500. 4.9529 6.9625 0.3531 12.2686
1000. 5.2331 7.3334 0.3586 12.9251
2000. 5.4525 7.6021 0.3674 13.4220
5000. 5.6576 7.8275 0.3833 13.8684
10000. 5.7599 7.9320 0.3992 14.0911
20000. 5.8280 8.0001 0.4177 14.2459
50000. 5.8846 8.0513 0.4466 14.3824
100000. 5.9100 8.0726 0.4712 14.4537