b(E) × 10^{6} [cm^{2}g^{−1}] for calcium tungstate (CaWO_{4})

⟨Z/A⟩ = 0.43761

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3223 0.3821 0.3956 2.1001
5. 1.8274 1.3865 0.4215 3.6354
10. 2.2395 2.1696 0.4121 4.8212
20. 2.6628 2.9144 0.3931 5.9702
50. 3.2182 4.0351 0.3784 7.6318
100. 3.6147 4.7812 0.3700 8.7659
200. 3.9783 5.4468 0.3658 9.7909
500. 4.3886 6.0630 0.3657 10.8174
1000. 4.6374 6.3938 0.3715 11.4027
2000. 4.8323 6.6323 0.3807 11.8453
5000. 5.0146 6.8328 0.3978 12.2451
10000. 5.1055 6.9257 0.4149 12.4460
20000. 5.1664 6.9861 0.4347 12.5871
50000. 5.2165 7.0316 0.4657 12.7139
100000. 5.2391 7.0503 0.4923 12.7818