b(E) × 10^{6} [cm^{2}g^{−1}] for cadmium tungstate (CdWO_{4})

⟨Z/A⟩ = 0.42747

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3867 0.4351 0.3891 2.2109
5. 1.9159 1.4889 0.4149 3.8196
10. 2.3473 2.3086 0.4029 5.0588
20. 2.7903 3.0893 0.3864 6.2659
50. 3.3714 4.2639 0.3734 8.0088
100. 3.7861 5.0457 0.3653 9.1970
200. 4.1663 5.7429 0.3613 10.2705
500. 4.5955 6.3877 0.3612 11.3444
1000. 4.8557 6.7332 0.3670 11.9557
2000. 5.0594 6.9825 0.3760 12.4179
5000. 5.2500 7.1919 0.3927 12.8345
10000. 5.3449 7.2889 0.4094 13.0433
20000. 5.4083 7.3521 0.4287 13.1892
50000. 5.4608 7.3997 0.4590 13.3195
100000. 5.4844 7.4193 0.4849 13.3887