b(E) × 10^{6} [cm^{2}g^{−1}] for cadmium telluride (CdTe) ⟨Z/A⟩ = 0.41665

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3240 0.5285 0.3825 2.2350
5. 1.8246 1.5231 0.4085 3.7562
10. 2.2318 2.2944 0.3958 4.9220
20. 2.6497 3.0419 0.3803 6.0720
50. 3.1985 4.1574 0.3692 7.7253
100. 3.5908 4.9029 0.3614 8.8550
200. 3.9512 5.5708 0.3576 9.8795
500. 4.3596 6.1899 0.3577 10.9071
1000. 4.6082 6.5213 0.3633 11.4927
2000. 4.8036 6.7619 0.3722 11.9377
5000. 4.9871 6.9640 0.3885 12.3396
10000. 5.0789 7.0579 0.4048 12.5416
20000. 5.1402 7.1192 0.4236 12.6831
50000. 5.1913 7.1653 0.4530 12.8096
100000. 5.2143 7.1846 0.4782 12.8771