b(E) × 10^{6} [cm^{2}g^{−1}] for

cadmium (Cd), Z = 48, A =112.414(4)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3098 0.5347 0.3849 2.2294
5. 1.8033 1.5133 0.4113 3.7279
10. 2.2047 2.2723 0.3934 4.8703
20. 2.6165 3.0106 0.3826 6.0097
50. 3.1574 4.1106 0.3715 7.6395
100. 3.5441 4.8465 0.3635 8.7541
200. 3.8997 5.5065 0.3597 9.7658
500. 4.3030 6.1190 0.3597 10.7817
1000. 4.5488 6.4472 0.3654 11.3613
2000. 4.7421 6.6857 0.3744 11.8022
5000. 4.9239 6.8861 0.3908 12.2007
10000. 5.0149 6.9793 0.4072 12.4015
20000. 5.0758 7.0401 0.4262 12.5422
50000. 5.1265 7.0859 0.4559 12.6683
100000. 5.1494 7.1050 0.4813 12.7357