b(E) × 10^{6} [cm^{2}g^{−1}] for

bismuth germanate (BGO) [(Bi_{2}O_{3})_{2}(GeO_{2})_{3}] ⟨Z/A⟩ = 0.42065

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.5373 0.3677 0.3843 2.2894
5. 2.1288 1.5482 0.4097 4.0868
10. 2.6116 2.4675 0.4009 5.4801
20. 3.1074 3.3303 0.3859 6.8236
50. 3.7571 4.6385 0.3691 8.7647
100. 4.2197 5.5058 0.3611 10.0866
200. 4.6430 6.2766 0.3572 11.2768
500. 5.1190 6.9867 0.3572 12.4629
1000. 5.4065 7.3655 0.3628 13.1348
2000. 5.6308 7.6384 0.3717 13.6410
5000. 5.8396 7.8672 0.3882 14.0950
10000. 5.9434 7.9730 0.4046 14.3209
20000. 6.0124 8.0418 0.4236 14.4777
50000. 6.0695 8.0934 0.4534 14.6162
100000. 6.0949 8.1148 0.4789 14.6887