b(E) × 10^{6} [cm^{2}g^{−1}] for barium fluoride (BaF_{2}) ⟨Z/A⟩ = 0.42207

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.1904 0.4473 0.3939 2.0317
5. 1.6414 1.3428 0.4200 3.4042
10. 2.0088 2.0396 0.4108 4.4591
20. 2.3862 2.7132 0.3911 5.4906
50. 2.8821 3.7193 0.3776 6.9791
100. 3.2367 4.3917 0.3693 7.9978
200. 3.5628 4.9937 0.3653 8.9218
500. 3.9322 5.5532 0.3653 9.8506
1000. 4.1571 5.8545 0.3710 10.3827
2000. 4.3340 6.0723 0.3803 10.7866
5000. 4.5001 6.2556 0.3972 11.1530
10000. 4.5834 6.3408 0.4141 11.3383
20000. 4.6391 6.3962 0.4339 11.4692
50000. 4.6854 6.4379 0.4647 11.5880
100000. 4.7062 6.4554 0.4910 11.6527