b(E) × 10^6 [cm^2g^{−1}] for UD rock for doug ⟨Z/A⟩ = 0.49602

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4195 0.1923 0.4479 1.0596 5. 0.5693 0.4710 0.4755 1.5159 10. 0.6916 0.6987 0.4627 1.8531 20. 0.8189 0.9425 0.4427 2.2041 50. 0.9892 1.2884 0.4207 2.6984 100. 1.1139 1.5299 0.4100 3.0538 200. 1.2320 1.7464 0.4046 3.3830 500. 1.3690 1.9718 0.4039 3.7448 1000. 1.4557 2.0992 0.4106 3.9655 2000. 1.5265 2.1906 0.4214 4.1384 5000. 1.5957 2.2695 0.4414 4.3066 10000. 1.6317 2.3068 0.4616 4.4001 20000. 1.6571 2.3304 0.4852 4.4726 50000. 1.6777 2.3492 0.5221 4.5490 100000. 1.6876 2.3569 0.5537 4.5983