Muons in water (vapor) (H_2O)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55509 7.562 × 10^{−4} 71.6 0.08101 3.5901 1.7952 4.3437 10.5962 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.013 8.013 6.895 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.249 6.249 1.261 × 10^0 20.0 MeV 6.802 × 10^1 4.879 4.879 2.360 × 10^0 30.0 MeV 8.509 × 10^1 3.784 3.784 4.720 × 10^0 40.0 MeV 1.003 × 10^2 3.231 3.231 7.598 × 10^0 80.0 MeV 1.527 × 10^2 2.425 2.425 2.234 × 10^1 100. MeV 1.764 × 10^2 2.281 2.281 3.087 × 10^1 140. MeV 2.218 × 10^2 2.139 2.139 4.907 × 10^1 200. MeV 2.868 × 10^2 2.066 2.066 7.772 × 10^1 260. MeV 3.496 × 10^2 2.052 0.000 2.052 Minimum ionization 300. MeV 3.917 × 10^2 2.056 0.000 2.056 1.264 × 10^2 400. MeV 4.945 × 10^2 2.082 0.000 2.083 1.747 × 10^2 800. MeV 8.995 × 10^2 2.219 0.000 0.000 2.220 3.606 × 10^2 1.00 GeV 1.101 × 10^3 2.277 0.000 0.000 2.278 4.496 × 10^2 1.40 GeV 1.502 × 10^3 2.372 0.000 0.001 2.373 6.214 × 10^2 2.00 GeV 2.103 × 10^3 2.479 0.001 0.000 0.001 2.480 8.684 × 10^2 3.00 GeV 3.104 × 10^3 2.604 0.001 0.001 0.001 2.608 1.261 × 10^3 4.00 GeV 4.104 × 10^3 2.695 0.001 0.001 0.002 2.700 1.638 × 10^3 8.00 GeV 8.105 × 10^3 2.902 0.004 0.003 0.004 2.913 3.055 × 10^3 10.0 GeV 1.011 × 10^4 2.958 0.005 0.005 0.005 2.972 3.735 × 10^3 14.0 GeV 1.411 × 10^4 3.036 0.007 0.008 0.007 3.058 5.060 × 10^3 20.0 GeV 2.011 × 10^4 3.112 0.011 0.013 0.009 3.146 6.993 × 10^3 30.0 GeV 3.011 × 10^4 3.190 0.019 0.023 0.013 3.246 1.012 × 10^4 40.0 GeV 4.011 × 10^4 3.241 0.027 0.034 0.018 3.319 1.316 × 10^4 80.0 GeV 8.011 × 10^4 3.351 0.060 0.081 0.034 3.527 2.483 × 10^4 100. GeV 1.001 × 10^5 3.383 0.078 0.107 0.042 3.611 3.043 × 10^4 140. GeV 1.401 × 10^5 3.429 0.116 0.161 0.059 3.765 4.128 × 10^4 200. GeV 2.001 × 10^5 3.475 0.174 0.246 0.084 3.979 5.677 × 10^4 300. GeV 3.001 × 10^5 3.525 0.275 0.391 0.125 4.317 8.089 × 10^4 400. GeV 4.001 × 10^5 3.560 0.379 0.542 0.167 4.648 1.032 × 10^5 800. GeV 8.001 × 10^5 3.642 0.814 1.171 0.337 5.963 1.790 × 10^5 1.00 TeV 1.000 × 10^6 3.668 1.038 1.496 0.423 6.626 2.108 × 10^5 1.23 TeV 1.231 × 10^6 3.692 1.299 1.868 0.526 7.385 Muon critical energy 1.40 TeV 1.400 × 10^6 3.707 1.491 2.142 0.601 7.941 2.659 × 10^5 2.00 TeV 2.000 × 10^6 3.749 2.186 3.132 0.870 9.937 3.333 × 10^5 3.00 TeV 3.000 × 10^6 3.798 3.352 4.781 1.332 13.263 4.201 × 10^5 4.00 TeV 4.000 × 10^6 3.833 4.537 6.452 1.803 16.626 4.873 × 10^5 8.00 TeV 8.000 × 10^6 3.919 9.338 13.185 3.763 30.206 6.633 × 10^5 10.0 TeV 1.000 × 10^7 3.948 11.766 16.575 4.773 37.063 7.229 × 10^5 14.0 TeV 1.400 × 10^7 3.991 16.613 23.331 6.854 50.789 8.148 × 10^5 20.0 TeV 2.000 × 10^7 4.037 23.944 33.521 10.051 71.553 9.138 × 10^5 30.0 TeV 3.000 × 10^7 4.091 36.151 50.475 15.600 106.318 1.028 × 10^6 40.0 TeV 4.000 × 10^7 4.130 48.424 67.484 21.296 141.334 1.109 × 10^6 80.0 TeV 8.000 × 10^7 4.226 97.657 135.575 45.199 282.658 1.305 × 10^6 100. TeV 1.000 × 10^8 4.257 122.347 169.661 57.590 353.855 1.369 × 10^6