Muons in valine (C_5H_{11}NOi_2)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54632 1.230 67.7 0.11386 3.3774 0.1441 2.6227 3.1059 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.943 7.943 6.951 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.193 6.193 1.272 × 10^0 20.0 MeV 6.802 × 10^1 4.834 4.834 2.381 × 10^0 30.0 MeV 8.509 × 10^1 3.748 3.748 4.763 × 10^0 40.0 MeV 1.003 × 10^2 3.200 3.200 7.669 × 10^0 80.0 MeV 1.527 × 10^2 2.398 2.398 2.256 × 10^1 100. MeV 1.764 × 10^2 2.245 2.245 3.121 × 10^1 140. MeV 2.218 × 10^2 2.088 2.088 4.977 × 10^1 200. MeV 2.868 × 10^2 1.997 1.997 7.927 × 10^1 300. MeV 3.917 × 10^2 1.961 0.000 1.961 1.300 × 10^2 324. MeV 4.161 × 10^2 1.960 0.000 1.960 Minimum ionization 400. MeV 4.945 × 10^2 1.965 0.000 1.965 1.809 × 10^2 800. MeV 8.995 × 10^2 2.036 0.000 0.000 2.037 3.810 × 10^2 1.00 GeV 1.101 × 10^3 2.069 0.000 0.000 2.070 4.783 × 10^2 1.40 GeV 1.502 × 10^3 2.123 0.000 0.001 2.124 6.690 × 10^2 2.00 GeV 2.103 × 10^3 2.182 0.001 0.000 0.001 2.184 9.474 × 10^2 3.00 GeV 3.104 × 10^3 2.250 0.001 0.001 0.001 2.253 1.398 × 10^3 4.00 GeV 4.104 × 10^3 2.297 0.001 0.001 0.002 2.302 1.837 × 10^3 8.00 GeV 8.105 × 10^3 2.406 0.003 0.003 0.004 2.416 3.528 × 10^3 10.0 GeV 1.011 × 10^4 2.439 0.004 0.004 0.005 2.452 4.349 × 10^3 14.0 GeV 1.411 × 10^4 2.487 0.006 0.007 0.007 2.507 5.962 × 10^3 20.0 GeV 2.011 × 10^4 2.535 0.010 0.011 0.009 2.566 8.326 × 10^3 30.0 GeV 3.011 × 10^4 2.588 0.016 0.020 0.014 2.638 1.217 × 10^4 40.0 GeV 4.011 × 10^4 2.623 0.023 0.029 0.018 2.694 1.592 × 10^4 80.0 GeV 8.011 × 10^4 2.706 0.053 0.071 0.034 2.865 3.029 × 10^4 100. GeV 1.001 × 10^5 2.732 0.069 0.094 0.043 2.937 3.718 × 10^4 140. GeV 1.401 × 10^5 2.770 0.102 0.141 0.059 3.072 5.050 × 10^4 200. GeV 2.001 × 10^5 2.810 0.153 0.216 0.084 3.263 6.944 × 10^4 300. GeV 3.001 × 10^5 2.855 0.242 0.344 0.126 3.567 9.873 × 10^4 400. GeV 4.001 × 10^5 2.887 0.334 0.477 0.168 3.866 1.257 × 10^5 800. GeV 8.001 × 10^5 2.966 0.717 1.032 0.339 5.054 2.159 × 10^5 1.00 TeV 1.000 × 10^6 2.991 0.915 1.319 0.426 5.652 2.533 × 10^5 1.12 TeV 1.121 × 10^6 3.004 1.035 1.490 0.480 6.009 Muon critical energy 1.40 TeV 1.400 × 10^6 3.030 1.315 1.890 0.604 6.839 3.175 × 10^5 2.00 TeV 2.000 × 10^6 3.071 1.929 2.765 0.875 8.641 3.954 × 10^5 3.00 TeV 3.000 × 10^6 3.119 2.959 4.223 1.341 11.643 4.948 × 10^5 4.00 TeV 4.000 × 10^6 3.154 4.007 5.702 1.816 14.679 5.711 × 10^5 8.00 TeV 8.000 × 10^6 3.238 8.254 11.660 3.790 26.943 7.693 × 10^5 10.0 TeV 1.000 × 10^7 3.266 10.403 14.661 4.808 33.138 8.361 × 10^5 14.0 TeV 1.400 × 10^7 3.309 14.691 20.640 6.905 45.545 9.387 × 10^5 20.0 TeV 2.000 × 10^7 3.355 21.179 29.659 10.127 64.320 1.049 × 10^6 30.0 TeV 3.000 × 10^7 3.408 31.984 44.665 15.722 95.779 1.176 × 10^6 40.0 TeV 4.000 × 10^7 3.446 42.848 59.721 21.465 127.480 1.266 × 10^6 80.0 TeV 8.000 × 10^7 3.540 86.412 119.994 45.576 255.523 1.483 × 10^6 100. TeV 1.000 × 10^8 3.571 108.253 150.167 58.078 320.070 1.553 × 10^6