Muons in tissue-equivalent gas (Propane based)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55027 1.826 × 10^{−3} 59.5 0.09802 3.5159 1.5139 3.9916 9.3529 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.132 8.132 6.782 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.337 6.337 1.241 × 10^0 20.0 MeV 6.802 × 10^1 4.943 4.944 2.326 × 10^0 30.0 MeV 8.509 × 10^1 3.831 3.831 4.656 × 10^0 40.0 MeV 1.003 × 10^2 3.269 3.269 7.500 × 10^0 80.0 MeV 1.527 × 10^2 2.450 2.450 2.209 × 10^1 100. MeV 1.764 × 10^2 2.303 2.303 3.053 × 10^1 140. MeV 2.218 × 10^2 2.158 2.158 4.855 × 10^1 200. MeV 2.868 × 10^2 2.084 2.084 7.695 × 10^1 263. MeV 3.527 × 10^2 2.068 0.000 2.069 Minimum ionization 300. MeV 3.917 × 10^2 2.071 0.000 2.072 1.252 × 10^2 400. MeV 4.945 × 10^2 2.097 0.000 2.097 1.732 × 10^2 800. MeV 8.995 × 10^2 2.232 0.000 0.000 2.232 3.580 × 10^2 1.00 GeV 1.101 × 10^3 2.289 0.000 0.000 2.290 4.464 × 10^2 1.40 GeV 1.502 × 10^3 2.383 0.000 0.001 2.384 6.175 × 10^2 2.00 GeV 2.103 × 10^3 2.488 0.001 0.000 0.001 2.490 8.635 × 10^2 3.00 GeV 3.104 × 10^3 2.613 0.001 0.001 0.001 2.616 1.255 × 10^3 4.00 GeV 4.104 × 10^3 2.694 0.001 0.001 0.002 2.698 1.630 × 10^3 8.00 GeV 8.105 × 10^3 2.863 0.003 0.003 0.004 2.873 3.061 × 10^3 10.0 GeV 1.011 × 10^4 2.912 0.004 0.004 0.005 2.925 3.751 × 10^3 14.0 GeV 1.411 × 10^4 2.981 0.006 0.007 0.007 3.001 5.100 × 10^3 20.0 GeV 2.011 × 10^4 3.049 0.010 0.011 0.009 3.079 7.072 × 10^3 30.0 GeV 3.011 × 10^4 3.119 0.016 0.020 0.014 3.168 1.027 × 10^4 40.0 GeV 4.011 × 10^4 3.164 0.023 0.029 0.018 3.234 1.339 × 10^4 80.0 GeV 8.011 × 10^4 3.263 0.052 0.071 0.034 3.421 2.540 × 10^4 100. GeV 1.001 × 10^5 3.292 0.068 0.093 0.043 3.496 3.118 × 10^4 140. GeV 1.401 × 10^5 3.334 0.101 0.140 0.059 3.634 4.239 × 10^4 200. GeV 2.001 × 10^5 3.377 0.152 0.214 0.084 3.828 5.848 × 10^4 300. GeV 3.001 × 10^5 3.425 0.239 0.341 0.126 4.131 8.361 × 10^4 400. GeV 4.001 × 10^5 3.458 0.331 0.473 0.168 4.429 1.070 × 10^5 800. GeV 8.001 × 10^5 3.537 0.711 1.023 0.340 5.610 1.870 × 10^5 1.00 TeV 1.000 × 10^6 3.562 0.908 1.307 0.427 6.204 2.209 × 10^5 1.34 TeV 1.335 × 10^6 3.596 1.239 1.781 0.576 7.192 Muon critical energy 1.40 TeV 1.400 × 10^6 3.601 1.304 1.873 0.605 7.384 2.800 × 10^5 2.00 TeV 2.000 × 10^6 3.643 1.913 2.742 0.876 9.175 3.527 × 10^5 3.00 TeV 3.000 × 10^6 3.691 2.935 4.188 1.343 12.157 4.471 × 10^5 4.00 TeV 4.000 × 10^6 3.726 3.975 5.654 1.818 15.173 5.206 × 10^5 8.00 TeV 8.000 × 10^6 3.811 8.188 11.563 3.795 27.358 7.142 × 10^5 10.0 TeV 1.000 × 10^7 3.839 10.320 14.540 4.814 33.514 7.802 × 10^5 14.0 TeV 1.400 × 10^7 3.882 14.575 20.470 6.914 45.841 8.818 × 10^5 20.0 TeV 2.000 × 10^7 3.928 21.013 29.416 10.141 64.498 9.916 × 10^5 30.0 TeV 3.000 × 10^7 3.982 31.735 44.299 15.744 95.759 1.118 × 10^6 40.0 TeV 4.000 × 10^7 4.020 42.516 59.231 21.495 127.263 1.208 × 10^6 80.0 TeV 8.000 × 10^7 4.115 85.747 119.011 45.644 254.518 1.426 × 10^6 100. TeV 1.000 × 10^8 4.146 107.420 148.937 58.166 318.670 1.497 × 10^6