Muons in terphenyl (C_{18}H_{10})

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.52148 1.234 71.7 0.14964 3.2685 0.1322 2.5429 3.2639 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.526 7.526 7.340 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.869 5.870 1.342 × 10^0 20.0 MeV 6.802 × 10^1 4.583 4.583 2.512 × 10^0 30.0 MeV 8.509 × 10^1 3.555 3.555 5.025 × 10^0 40.0 MeV 1.003 × 10^2 3.035 3.035 8.089 × 10^0 80.0 MeV 1.527 × 10^2 2.274 2.274 2.379 × 10^1 100. MeV 1.764 × 10^2 2.131 2.131 3.290 × 10^1 140. MeV 2.218 × 10^2 1.984 1.984 5.245 × 10^1 200. MeV 2.868 × 10^2 1.900 1.900 8.347 × 10^1 300. MeV 3.917 × 10^2 1.868 0.000 1.868 1.367 × 10^2 318. MeV 4.105 × 10^2 1.867 0.000 1.867 Minimum ionization 400. MeV 4.945 × 10^2 1.873 0.000 1.874 1.902 × 10^2 800. MeV 8.995 × 10^2 1.944 0.000 0.000 1.944 3.998 × 10^2 1.00 GeV 1.101 × 10^3 1.976 0.000 0.000 1.977 5.018 × 10^2 1.40 GeV 1.502 × 10^3 2.028 0.000 0.001 2.029 7.014 × 10^2 2.00 GeV 2.103 × 10^3 2.086 0.000 0.000 0.001 2.087 9.927 × 10^2 3.00 GeV 3.104 × 10^3 2.151 0.001 0.001 0.001 2.154 1.464 × 10^3 4.00 GeV 4.104 × 10^3 2.196 0.001 0.001 0.002 2.200 1.923 × 10^3 8.00 GeV 8.105 × 10^3 2.300 0.003 0.003 0.004 2.310 3.692 × 10^3 10.0 GeV 1.011 × 10^4 2.332 0.004 0.004 0.005 2.344 4.551 × 10^3 14.0 GeV 1.411 × 10^4 2.377 0.006 0.006 0.007 2.396 6.238 × 10^3 20.0 GeV 2.011 × 10^4 2.423 0.009 0.011 0.009 2.453 8.711 × 10^3 30.0 GeV 3.011 × 10^4 2.474 0.015 0.019 0.014 2.521 1.273 × 10^4 40.0 GeV 4.011 × 10^4 2.508 0.022 0.027 0.018 2.575 1.665 × 10^4 80.0 GeV 8.011 × 10^4 2.586 0.049 0.066 0.034 2.737 3.170 × 10^4 100. GeV 1.001 × 10^5 2.611 0.064 0.088 0.043 2.805 3.891 × 10^4 140. GeV 1.401 × 10^5 2.647 0.095 0.132 0.059 2.933 5.285 × 10^4 200. GeV 2.001 × 10^5 2.686 0.143 0.202 0.084 3.114 7.270 × 10^4 300. GeV 3.001 × 10^5 2.729 0.225 0.321 0.126 3.401 1.034 × 10^5 400. GeV 4.001 × 10^5 2.760 0.311 0.445 0.168 3.684 1.316 × 10^5 800. GeV 8.001 × 10^5 2.834 0.669 0.964 0.339 4.807 2.264 × 10^5 1.00 TeV 1.000 × 10^6 2.859 0.854 1.232 0.426 5.371 2.658 × 10^5 1.13 TeV 1.134 × 10^6 2.872 0.978 1.409 0.485 5.745 Muon critical energy 1.40 TeV 1.400 × 10^6 2.895 1.227 1.766 0.604 6.494 3.334 × 10^5 2.00 TeV 2.000 × 10^6 2.935 1.801 2.585 0.875 8.197 4.155 × 10^5 3.00 TeV 3.000 × 10^6 2.981 2.762 3.949 1.342 11.034 5.203 × 10^5 4.00 TeV 4.000 × 10^6 3.014 3.741 5.332 1.816 13.903 6.009 × 10^5 8.00 TeV 8.000 × 10^6 3.095 7.706 10.906 3.791 25.498 8.102 × 10^5 10.0 TeV 1.000 × 10^7 3.121 9.712 13.715 4.808 31.356 8.808 × 10^5 14.0 TeV 1.400 × 10^7 3.162 13.714 19.309 6.905 43.091 9.892 × 10^5 20.0 TeV 2.000 × 10^7 3.206 19.771 27.749 10.128 60.853 1.106 × 10^6 30.0 TeV 3.000 × 10^7 3.256 29.855 41.791 15.722 90.625 1.240 × 10^6 40.0 TeV 4.000 × 10^7 3.293 39.995 55.879 21.466 120.633 1.335 × 10^6 80.0 TeV 8.000 × 10^7 3.382 80.630 112.283 45.576 241.871 1.565 × 10^6 100. TeV 1.000 × 10^8 3.412 100.995 140.519 58.076 303.003 1.638 × 10^6