Muons in silver iodide (AgI)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.42594 6.010 543.5 0.25059 2.6572 0.0148 3.2908 5.9342 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.546 4.546 1.248 × 10^0 14.0 MeV 5.616 × 10^1 3.592 3.592 2.247 × 10^0 20.0 MeV 6.802 × 10^1 2.839 2.839 4.146 × 10^0 30.0 MeV 8.509 × 10^1 2.230 2.230 8.173 × 10^0 40.0 MeV 1.003 × 10^2 1.920 1.920 1.304 × 10^1 80.0 MeV 1.527 × 10^2 1.468 1.468 3.758 × 10^1 100. MeV 1.764 × 10^2 1.388 1.388 5.162 × 10^1 140. MeV 2.218 × 10^2 1.311 1.311 8.141 × 10^1 200. MeV 2.868 × 10^2 1.274 1.274 1.280 × 10^2 242. MeV 3.316 × 10^2 1.269 1.270 Minimum ionization 300. MeV 3.917 × 10^2 1.274 0.000 0.000 1.274 2.067 × 10^2 400. MeV 4.945 × 10^2 1.294 0.000 0.000 1.294 2.846 × 10^2 800. MeV 8.995 × 10^2 1.381 0.001 0.000 1.382 5.833 × 10^2 1.00 GeV 1.101 × 10^3 1.415 0.001 0.000 1.417 7.262 × 10^2 1.40 GeV 1.502 × 10^3 1.471 0.002 0.000 0.001 1.473 1.003 × 10^3 2.00 GeV 2.103 × 10^3 1.530 0.003 0.001 0.001 1.535 1.401 × 10^3 3.00 GeV 3.104 × 10^3 1.598 0.005 0.003 0.001 1.607 2.037 × 10^3 4.00 GeV 4.104 × 10^3 1.645 0.007 0.005 0.002 1.659 2.649 × 10^3 8.00 GeV 8.105 × 10^3 1.750 0.017 0.017 0.003 1.788 4.962 × 10^3 10.0 GeV 1.011 × 10^4 1.782 0.023 0.024 0.004 1.833 6.066 × 10^3 14.0 GeV 1.411 × 10^4 1.827 0.035 0.038 0.005 1.907 8.204 × 10^3 20.0 GeV 2.011 × 10^4 1.872 0.054 0.062 0.008 1.997 1.128 × 10^4 30.0 GeV 3.011 × 10^4 1.920 0.089 0.109 0.011 2.130 1.612 × 10^4 40.0 GeV 4.011 × 10^4 1.951 0.126 0.159 0.015 2.252 2.069 × 10^4 80.0 GeV 8.011 × 10^4 2.021 0.284 0.382 0.029 2.717 3.682 × 10^4 100. GeV 1.001 × 10^5 2.041 0.368 0.502 0.036 2.949 4.389 × 10^4 140. GeV 1.401 × 10^5 2.072 0.541 0.749 0.050 3.413 5.649 × 10^4 200. GeV 2.001 × 10^5 2.103 0.810 1.141 0.072 4.127 7.246 × 10^4 207. GeV 2.076 × 10^5 2.106 0.844 1.189 0.074 4.214 Muon critical energy 300. GeV 3.001 × 10^5 2.139 1.271 1.795 0.107 5.313 9.377 × 10^4 400. GeV 4.001 × 10^5 2.164 1.747 2.473 0.143 6.528 1.107 × 10^5 800. GeV 8.001 × 10^5 2.225 3.713 5.254 0.290 11.482 1.564 × 10^5 1.00 TeV 1.000 × 10^6 2.245 4.723 6.676 0.364 14.009 1.721 × 10^5 1.40 TeV 1.400 × 10^6 2.275 6.748 9.514 0.516 19.054 1.965 × 10^5 2.00 TeV 2.000 × 10^6 2.307 9.846 13.845 0.746 26.746 2.230 × 10^5 3.00 TeV 3.000 × 10^6 2.344 15.019 21.042 1.140 39.547 2.535 × 10^5 4.00 TeV 4.000 × 10^6 2.371 20.261 28.316 1.541 52.491 2.754 × 10^5 8.00 TeV 8.000 × 10^6 2.437 41.398 57.558 3.202 104.596 3.283 × 10^5 10.0 TeV 1.000 × 10^7 2.459 52.050 72.257 4.055 130.822 3.454 × 10^5 14.0 TeV 1.400 × 10^7 2.492 73.296 101.586 5.806 183.181 3.711 × 10^5 20.0 TeV 2.000 × 10^7 2.528 105.356 145.767 8.489 262.141 3.984 × 10^5 30.0 TeV 3.000 × 10^7 2.569 158.727 219.278 13.125 393.702 4.293 × 10^5 40.0 TeV 4.000 × 10^7 2.599 212.293 292.964 17.871 525.728 4.512 × 10^5 80.0 TeV 8.000 × 10^7 2.672 426.880 587.911 37.683 1055.148 5.038 × 10^5 100. TeV 1.000 × 10^8 2.697 534.358 735.520 47.915 1320.490 5.207 × 10^5