Muons in pyridine (C_5H_5N)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53096 0.982 66.2 0.16399 3.1977 0.1670 2.5245 3.3148 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.742 7.742 7.131 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.035 6.035 1.304 × 10^0 20.0 MeV 6.802 × 10^1 4.711 4.711 2.443 × 10^0 30.0 MeV 8.509 × 10^1 3.652 3.652 4.888 × 10^0 40.0 MeV 1.003 × 10^2 3.117 3.118 7.870 × 10^0 80.0 MeV 1.527 × 10^2 2.338 2.338 2.316 × 10^1 100. MeV 1.764 × 10^2 2.191 2.191 3.202 × 10^1 140. MeV 2.218 × 10^2 2.040 2.040 5.103 × 10^1 200. MeV 2.868 × 10^2 1.952 1.952 8.121 × 10^1 300. MeV 3.917 × 10^2 1.918 0.000 1.919 1.330 × 10^2 318. MeV 4.105 × 10^2 1.918 0.000 1.918 Minimum ionization 400. MeV 4.945 × 10^2 1.924 0.000 1.924 1.851 × 10^2 800. MeV 8.995 × 10^2 1.995 0.000 0.000 1.996 3.893 × 10^2 1.00 GeV 1.101 × 10^3 2.028 0.000 0.000 2.029 4.887 × 10^2 1.40 GeV 1.502 × 10^3 2.081 0.000 0.001 2.082 6.832 × 10^2 2.00 GeV 2.103 × 10^3 2.140 0.000 0.000 0.001 2.142 9.671 × 10^2 3.00 GeV 3.104 × 10^3 2.207 0.001 0.001 0.001 2.210 1.426 × 10^3 4.00 GeV 4.104 × 10^3 2.253 0.001 0.001 0.002 2.257 1.874 × 10^3 8.00 GeV 8.105 × 10^3 2.359 0.003 0.003 0.004 2.369 3.598 × 10^3 10.0 GeV 1.011 × 10^4 2.391 0.004 0.004 0.005 2.404 4.436 × 10^3 14.0 GeV 1.411 × 10^4 2.438 0.006 0.006 0.007 2.457 6.081 × 10^3 20.0 GeV 2.011 × 10^4 2.485 0.009 0.011 0.009 2.514 8.494 × 10^3 30.0 GeV 3.011 × 10^4 2.536 0.016 0.019 0.014 2.584 1.241 × 10^4 40.0 GeV 4.011 × 10^4 2.570 0.022 0.028 0.018 2.638 1.624 × 10^4 80.0 GeV 8.011 × 10^4 2.651 0.050 0.067 0.034 2.803 3.093 × 10^4 100. GeV 1.001 × 10^5 2.675 0.065 0.089 0.043 2.873 3.797 × 10^4 140. GeV 1.401 × 10^5 2.713 0.096 0.134 0.059 3.002 5.159 × 10^4 200. GeV 2.001 × 10^5 2.752 0.145 0.205 0.084 3.186 7.098 × 10^4 300. GeV 3.001 × 10^5 2.796 0.229 0.326 0.126 3.477 1.010 × 10^5 400. GeV 4.001 × 10^5 2.827 0.317 0.453 0.168 3.764 1.286 × 10^5 800. GeV 8.001 × 10^5 2.903 0.681 0.979 0.339 4.903 2.215 × 10^5 1.00 TeV 1.000 × 10^6 2.928 0.869 1.252 0.426 5.475 2.601 × 10^5 1.14 TeV 1.145 × 10^6 2.943 1.005 1.447 0.491 5.886 Muon critical energy 1.40 TeV 1.400 × 10^6 2.965 1.248 1.795 0.605 6.613 3.264 × 10^5 2.00 TeV 2.000 × 10^6 3.006 1.831 2.627 0.876 8.340 4.071 × 10^5 3.00 TeV 3.000 × 10^6 3.052 2.809 4.013 1.342 11.217 5.101 × 10^5 4.00 TeV 4.000 × 10^6 3.086 3.805 5.419 1.817 14.126 5.894 × 10^5 8.00 TeV 8.000 × 10^6 3.168 7.837 11.084 3.793 25.882 7.955 × 10^5 10.0 TeV 1.000 × 10^7 3.195 9.877 13.937 4.811 31.821 8.651 × 10^5 14.0 TeV 1.400 × 10^7 3.236 13.949 19.622 6.909 43.717 9.719 × 10^5 20.0 TeV 2.000 × 10^7 3.281 20.110 28.199 10.133 61.723 1.087 × 10^6 30.0 TeV 3.000 × 10^7 3.332 30.368 42.468 15.732 91.900 1.219 × 10^6 40.0 TeV 4.000 × 10^7 3.370 40.684 56.784 21.479 122.316 1.313 × 10^6 80.0 TeV 8.000 × 10^7 3.461 82.033 114.099 45.606 245.199 1.539 × 10^6 100. TeV 1.000 × 10^8 3.491 102.759 142.791 58.117 307.158 1.612 × 10^6