Muons in platinum (Pt)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 78 (Pt) 195.084 (9) 21.450 790.0 0.11128 3.0417 0.1484 3.6212 5.4732 0.12

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.896 3.896 1.492 × 10^0 14.0 MeV 5.616 × 10^1 3.109 3.109 2.651 × 10^0 20.0 MeV 6.802 × 10^1 2.477 2.477 4.836 × 10^0 30.0 MeV 8.509 × 10^1 1.958 1.958 9.435 × 10^0 40.0 MeV 1.003 × 10^2 1.690 1.690 1.496 × 10^1 80.0 MeV 1.527 × 10^2 1.297 1.297 4.278 × 10^1 100. MeV 1.764 × 10^2 1.228 1.228 5.866 × 10^1 140. MeV 2.218 × 10^2 1.162 1.162 9.229 × 10^1 200. MeV 2.868 × 10^2 1.132 1.132 1.448 × 10^2 237. MeV 3.260 × 10^2 1.128 0.000 1.129 Minimum ionization 300. MeV 3.917 × 10^2 1.134 0.000 0.000 1.134 2.332 × 10^2 400. MeV 4.945 × 10^2 1.153 0.000 0.000 1.153 3.207 × 10^2 800. MeV 8.995 × 10^2 1.233 0.001 0.000 1.234 6.555 × 10^2 1.00 GeV 1.101 × 10^3 1.265 0.001 0.000 1.267 8.154 × 10^2 1.40 GeV 1.502 × 10^3 1.315 0.002 0.001 1.318 1.125 × 10^3 2.00 GeV 2.103 × 10^3 1.370 0.004 0.001 0.001 1.376 1.570 × 10^3 3.00 GeV 3.104 × 10^3 1.431 0.007 0.003 0.001 1.443 2.278 × 10^3 4.00 GeV 4.104 × 10^3 1.474 0.010 0.006 0.002 1.492 2.959 × 10^3 8.00 GeV 8.105 × 10^3 1.570 0.024 0.022 0.003 1.620 5.523 × 10^3 10.0 GeV 1.011 × 10^4 1.599 0.032 0.031 0.004 1.666 6.740 × 10^3 14.0 GeV 1.411 × 10^4 1.641 0.049 0.050 0.005 1.746 9.083 × 10^3 20.0 GeV 2.011 × 10^4 1.683 0.076 0.082 0.007 1.849 1.242 × 10^4 30.0 GeV 3.011 × 10^4 1.727 0.125 0.144 0.011 2.007 1.761 × 10^4 40.0 GeV 4.011 × 10^4 1.756 0.177 0.212 0.014 2.160 2.241 × 10^4 80.0 GeV 8.011 × 10^4 1.821 0.399 0.513 0.028 2.763 3.874 × 10^4 100. GeV 1.001 × 10^5 1.841 0.517 0.675 0.035 3.070 4.561 × 10^4 140. GeV 1.401 × 10^5 1.870 0.759 1.009 0.048 3.688 5.748 × 10^4 144. GeV 1.438 × 10^5 1.872 0.782 1.041 0.049 3.746 Muon critical energy 200. GeV 2.001 × 10^5 1.900 1.138 1.538 0.069 4.646 7.196 × 10^4 300. GeV 3.001 × 10^5 1.933 1.784 2.422 0.103 6.243 9.047 × 10^4 400. GeV 4.001 × 10^5 1.957 2.451 3.337 0.137 7.884 1.047 × 10^5 800. GeV 8.001 × 10^5 2.014 5.204 7.090 0.277 14.587 1.414 × 10^5 1.00 TeV 1.000 × 10^6 2.033 6.618 9.009 0.348 18.009 1.538 × 10^5 1.40 TeV 1.400 × 10^6 2.061 9.449 12.836 0.493 24.841 1.726 × 10^5 2.00 TeV 2.000 × 10^6 2.091 13.779 18.675 0.713 35.261 1.928 × 10^5 3.00 TeV 3.000 × 10^6 2.126 21.002 28.378 1.090 52.599 2.159 × 10^5 4.00 TeV 4.000 × 10^6 2.152 28.319 38.183 1.473 70.128 2.323 × 10^5 8.00 TeV 8.000 × 10^6 2.214 57.805 77.589 3.058 140.669 2.717 × 10^5 10.0 TeV 1.000 × 10^7 2.234 72.658 97.395 3.872 176.161 2.844 × 10^5 14.0 TeV 1.400 × 10^7 2.265 102.282 136.916 5.541 247.006 3.035 × 10^5 20.0 TeV 2.000 × 10^7 2.299 146.966 196.448 8.098 353.813 3.237 × 10^5 30.0 TeV 3.000 × 10^7 2.338 221.354 295.488 12.513 531.696 3.466 × 10^5 40.0 TeV 4.000 × 10^7 2.365 295.996 394.757 17.031 710.151 3.628 × 10^5 80.0 TeV 8.000 × 10^7 2.434 594.964 792.106 35.880 1425.386 4.018 × 10^5 100. TeV 1.000 × 10^8 2.457 744.680 990.960 45.610 1783.709 4.143 × 10^5