Muons in hassium (Hs)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 108 (Hs) [277.1520 (1)] ?? 1102.0 0.27500 3.0000 0.6392 3.0000 6.5619 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.590 3.590 1.656 × 10^0 14.0 MeV 5.616 × 10^1 2.896 2.896 2.907 × 10^0 20.0 MeV 6.802 × 10^1 2.328 2.328 5.240 × 10^0 30.0 MeV 8.509 × 10^1 1.855 1.855 1.011 × 10^1 40.0 MeV 1.003 × 10^2 1.610 1.610 1.593 × 10^1 80.0 MeV 1.527 × 10^2 1.250 1.250 4.493 × 10^1 100. MeV 1.764 × 10^2 1.188 1.188 6.138 × 10^1 140. MeV 2.218 × 10^2 1.131 1.131 9.603 × 10^1 200. MeV 2.868 × 10^2 1.110 1.110 1.497 × 10^2 207. MeV 2.943 × 10^2 1.110 0.000 1.110 Minimum ionization 300. MeV 3.917 × 10^2 1.124 0.000 0.000 1.125 2.394 × 10^2 400. MeV 4.945 × 10^2 1.153 0.000 0.000 1.153 3.272 × 10^2 800. MeV 8.995 × 10^2 1.253 0.001 0.000 1.254 6.588 × 10^2 1.00 GeV 1.101 × 10^3 1.289 0.002 0.000 1.292 8.159 × 10^2 1.40 GeV 1.502 × 10^3 1.346 0.003 0.000 1.350 1.118 × 10^3 2.00 GeV 2.103 × 10^3 1.406 0.005 0.000 0.001 1.413 1.552 × 10^3 3.00 GeV 3.104 × 10^3 1.472 0.009 0.003 0.001 1.485 2.241 × 10^3 4.00 GeV 4.104 × 10^3 1.517 0.013 0.006 0.001 1.538 2.902 × 10^3 8.00 GeV 8.105 × 10^3 1.615 0.032 0.024 0.003 1.675 5.385 × 10^3 10.0 GeV 1.011 × 10^4 1.644 0.042 0.035 0.004 1.726 6.561 × 10^3 14.0 GeV 1.411 × 10^4 1.685 0.064 0.058 0.005 1.814 8.820 × 10^3 20.0 GeV 2.011 × 10^4 1.725 0.100 0.097 0.007 1.931 1.202 × 10^4 30.0 GeV 3.011 × 10^4 1.767 0.164 0.173 0.010 2.116 1.697 × 10^4 40.0 GeV 4.011 × 10^4 1.795 0.232 0.258 0.014 2.300 2.150 × 10^4 80.0 GeV 8.011 × 10^4 1.857 0.525 0.631 0.027 3.040 3.659 × 10^4 100. GeV 1.001 × 10^5 1.876 0.680 0.832 0.033 3.423 4.279 × 10^4 119. GeV 1.188 × 10^5 1.890 0.827 1.024 0.040 3.782 Muon critical energy 140. GeV 1.401 × 10^5 1.904 0.998 1.248 0.047 4.197 5.333 × 10^4 200. GeV 2.001 × 10^5 1.933 1.495 1.907 0.066 5.403 6.590 × 10^4 300. GeV 3.001 × 10^5 1.966 2.342 3.007 0.100 7.417 8.165 × 10^4 400. GeV 4.001 × 10^5 1.990 3.218 4.147 0.133 9.490 9.354 × 10^4 800. GeV 8.001 × 10^5 2.048 6.827 8.824 0.268 17.969 1.237 × 10^5 1.00 TeV 1.000 × 10^6 2.066 8.679 11.217 0.337 22.302 1.337 × 10^5 1.40 TeV 1.400 × 10^6 2.095 12.387 15.987 0.478 30.948 1.488 × 10^5 2.00 TeV 2.000 × 10^6 2.125 18.054 23.267 0.690 44.138 1.650 × 10^5 3.00 TeV 3.000 × 10^6 2.160 27.505 35.360 1.055 66.083 1.834 × 10^5 4.00 TeV 4.000 × 10^6 2.186 37.075 47.582 1.425 88.270 1.964 × 10^5 8.00 TeV 8.000 × 10^6 2.248 75.625 96.702 2.958 177.535 2.277 × 10^5 10.0 TeV 1.000 × 10^7 2.268 95.036 121.390 3.744 222.441 2.378 × 10^5 14.0 TeV 1.400 × 10^7 2.300 133.752 170.652 5.356 312.063 2.529 × 10^5 20.0 TeV 2.000 × 10^7 2.333 192.138 244.858 7.826 447.158 2.689 × 10^5 30.0 TeV 3.000 × 10^7 2.372 289.430 368.301 12.089 672.195 2.870 × 10^5 40.0 TeV 4.000 × 10^7 2.400 387.063 492.028 16.451 897.944 2.998 × 10^5 80.0 TeV 8.000 × 10^7 2.469 777.558 987.280 34.647 1801.957 3.306 × 10^5 100. TeV 1.000 × 10^8 2.492 972.920 1235.130 44.040 2254.585 3.405 × 10^5