Muons in ferroboride (FeB)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.46507 7.150 261.0 0.12911 3.0240 −0.0988 3.1749 4.2057 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 5.597 5.597 1.002 × 10^0 14.0 MeV 5.616 × 10^1 4.397 4.397 1.816 × 10^0 20.0 MeV 6.802 × 10^1 3.457 3.457 3.372 × 10^0 30.0 MeV 8.509 × 10^1 2.701 2.701 6.689 × 10^0 40.0 MeV 1.003 × 10^2 2.313 2.313 1.072 × 10^1 80.0 MeV 1.527 × 10^2 1.741 1.741 3.127 × 10^1 100. MeV 1.764 × 10^2 1.637 1.638 4.315 × 10^1 140. MeV 2.218 × 10^2 1.534 1.534 6.850 × 10^1 200. MeV 2.868 × 10^2 1.479 1.480 1.085 × 10^2 277. MeV 3.673 × 10^2 1.466 0.000 1.466 Minimum ionization 300. MeV 3.917 × 10^2 1.467 0.000 1.467 1.765 × 10^2 400. MeV 4.945 × 10^2 1.480 0.000 0.000 1.481 2.444 × 10^2 800. MeV 8.995 × 10^2 1.559 0.000 0.000 1.559 5.076 × 10^2 1.00 GeV 1.101 × 10^3 1.592 0.001 0.000 1.593 6.344 × 10^2 1.40 GeV 1.502 × 10^3 1.644 0.001 0.000 0.001 1.646 8.813 × 10^2 2.00 GeV 2.103 × 10^3 1.702 0.001 0.001 0.001 1.706 1.239 × 10^3 3.00 GeV 3.104 × 10^3 1.768 0.003 0.002 0.001 1.774 1.813 × 10^3 4.00 GeV 4.104 × 10^3 1.813 0.004 0.003 0.002 1.822 2.369 × 10^3 8.00 GeV 8.105 × 10^3 1.917 0.009 0.009 0.004 1.939 4.489 × 10^3 10.0 GeV 1.011 × 10^4 1.948 0.012 0.013 0.004 1.977 5.511 × 10^3 14.0 GeV 1.411 × 10^4 1.993 0.018 0.020 0.006 2.038 7.502 × 10^3 20.0 GeV 2.011 × 10^4 2.038 0.029 0.033 0.008 2.108 1.039 × 10^4 30.0 GeV 3.011 × 10^4 2.085 0.047 0.058 0.012 2.203 1.503 × 10^4 40.0 GeV 4.011 × 10^4 2.117 0.066 0.085 0.016 2.285 1.949 × 10^4 80.0 GeV 8.011 × 10^4 2.189 0.150 0.204 0.032 2.575 3.595 × 10^4 100. GeV 1.001 × 10^5 2.211 0.194 0.268 0.039 2.713 4.351 × 10^4 140. GeV 1.401 × 10^5 2.244 0.285 0.401 0.054 2.985 5.756 × 10^4 200. GeV 2.001 × 10^5 2.278 0.427 0.611 0.077 3.394 7.640 × 10^4 300. GeV 3.001 × 10^5 2.316 0.671 0.964 0.116 4.068 1.033 × 10^5 390. GeV 3.901 × 10^5 2.341 0.898 1.293 0.151 4.684 Muon critical energy 400. GeV 4.001 × 10^5 2.344 0.923 1.330 0.155 4.753 1.260 × 10^5 800. GeV 8.001 × 10^5 2.410 1.968 2.835 0.312 7.527 1.923 × 10^5 1.00 TeV 1.000 × 10^6 2.432 2.505 3.607 0.392 8.938 2.167 × 10^5 1.40 TeV 1.400 × 10^6 2.465 3.584 5.147 0.556 11.753 2.556 × 10^5 2.00 TeV 2.000 × 10^6 2.500 5.237 7.500 0.805 16.043 2.991 × 10^5 3.00 TeV 3.000 × 10^6 2.541 7.999 11.411 1.232 23.184 3.507 × 10^5 4.00 TeV 4.000 × 10^6 2.570 10.801 15.368 1.666 30.406 3.883 × 10^5 8.00 TeV 8.000 × 10^6 2.643 22.113 31.281 3.469 59.507 4.806 × 10^5 10.0 TeV 1.000 × 10^7 2.666 27.820 39.285 4.397 74.168 5.106 × 10^5 14.0 TeV 1.400 × 10^7 2.703 39.203 55.250 6.302 103.459 5.561 × 10^5 20.0 TeV 2.000 × 10^7 2.741 56.391 79.309 9.226 147.669 6.044 × 10^5 30.0 TeV 3.000 × 10^7 2.787 85.006 119.338 14.289 221.421 6.593 × 10^5 40.0 TeV 4.000 × 10^7 2.819 113.738 159.473 19.478 295.509 6.983 × 10^5 80.0 TeV 8.000 × 10^7 2.899 228.875 320.135 41.187 593.097 7.920 × 10^5 100. TeV 1.000 × 10^8 2.926 286.558 400.547 52.416 742.448 8.220 × 10^5