Muons in ethylene (C_2H_4)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.57034 1.175 × 10^{−3} 50.7 0.10636 3.5387 1.5528 3.9327 9.4380 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.598 8.598 6.406 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.695 6.695 1.173 × 10^0 20.0 MeV 6.802 × 10^1 5.219 5.220 2.200 × 10^0 30.0 MeV 8.509 × 10^1 4.042 4.042 4.408 × 10^0 40.0 MeV 1.003 × 10^2 3.447 3.447 7.105 × 10^0 80.0 MeV 1.527 × 10^2 2.581 2.581 2.095 × 10^1 100. MeV 1.764 × 10^2 2.425 2.425 2.896 × 10^1 140. MeV 2.218 × 10^2 2.271 2.272 4.608 × 10^1 200. MeV 2.868 × 10^2 2.192 2.192 7.307 × 10^1 266. MeV 3.567 × 10^2 2.174 0.000 2.175 Minimum ionization 300. MeV 3.917 × 10^2 2.177 0.000 2.177 1.190 × 10^2 400. MeV 4.945 × 10^2 2.203 0.000 2.203 1.647 × 10^2 800. MeV 8.995 × 10^2 2.341 0.000 0.000 2.342 3.407 × 10^2 1.00 GeV 1.101 × 10^3 2.401 0.000 0.000 2.401 4.250 × 10^2 1.40 GeV 1.502 × 10^3 2.498 0.000 0.001 2.499 5.881 × 10^2 2.00 GeV 2.103 × 10^3 2.607 0.000 0.000 0.001 2.609 8.228 × 10^2 3.00 GeV 3.104 × 10^3 2.736 0.001 0.000 0.001 2.739 1.196 × 10^3 4.00 GeV 4.104 × 10^3 2.825 0.001 0.001 0.002 2.829 1.555 × 10^3 8.00 GeV 8.105 × 10^3 3.003 0.003 0.003 0.004 3.012 2.919 × 10^3 10.0 GeV 1.011 × 10^4 3.054 0.004 0.004 0.005 3.066 3.577 × 10^3 14.0 GeV 1.411 × 10^4 3.127 0.006 0.006 0.007 3.145 4.864 × 10^3 20.0 GeV 2.011 × 10^4 3.197 0.009 0.010 0.009 3.225 6.746 × 10^3 30.0 GeV 3.011 × 10^4 3.270 0.015 0.018 0.014 3.316 9.801 × 10^3 40.0 GeV 4.011 × 10^4 3.317 0.021 0.026 0.018 3.382 1.279 × 10^4 80.0 GeV 8.011 × 10^4 3.419 0.047 0.063 0.035 3.564 2.429 × 10^4 100. GeV 1.001 × 10^5 3.449 0.061 0.084 0.043 3.637 2.984 × 10^4 140. GeV 1.401 × 10^5 3.492 0.091 0.126 0.060 3.769 4.064 × 10^4 200. GeV 2.001 × 10^5 3.537 0.137 0.193 0.085 3.951 5.618 × 10^4 300. GeV 3.001 × 10^5 3.585 0.216 0.307 0.127 4.236 8.061 × 10^4 400. GeV 4.001 × 10^5 3.619 0.299 0.427 0.170 4.515 1.035 × 10^5 800. GeV 8.001 × 10^5 3.701 0.644 0.925 0.343 5.613 1.828 × 10^5 1.00 TeV 1.000 × 10^6 3.728 0.822 1.183 0.430 6.164 2.168 × 10^5 1.40 TeV 1.400 × 10^6 3.768 1.182 1.697 0.611 7.258 2.765 × 10^5 1.51 TeV 1.508 × 10^6 3.777 1.281 1.837 0.659 7.554 Muon critical energy 2.00 TeV 2.000 × 10^6 3.811 1.736 2.485 0.884 8.917 3.510 × 10^5 3.00 TeV 3.000 × 10^6 3.861 2.665 3.799 1.355 11.681 4.487 × 10^5 4.00 TeV 4.000 × 10^6 3.897 3.612 5.132 1.834 14.476 5.254 × 10^5 8.00 TeV 8.000 × 10^6 3.986 7.450 10.502 3.831 25.770 7.298 × 10^5 10.0 TeV 1.000 × 10^7 4.015 9.393 13.208 4.860 31.477 7.999 × 10^5 14.0 TeV 1.400 × 10^7 4.059 13.272 18.599 6.982 42.912 9.083 × 10^5 20.0 TeV 2.000 × 10^7 4.107 19.144 26.732 10.243 60.227 1.026 × 10^6 30.0 TeV 3.000 × 10^7 4.163 28.924 40.262 15.907 89.256 1.161 × 10^6 40.0 TeV 4.000 × 10^7 4.202 38.762 53.838 21.722 118.524 1.258 × 10^6 80.0 TeV 8.000 × 10^7 4.301 78.203 108.188 46.153 236.845 1.493 × 10^6 100. TeV 1.000 × 10^8 4.333 97.977 135.397 58.825 296.533 1.568 × 10^6