Muons in boron carbide (B_4C)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.47059 2.520 84.7 0.37087 2.8076 0.0093 2.1006 2.9859 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.646 6.646 8.325 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.187 5.187 1.521 × 10^0 20.0 MeV 6.802 × 10^1 4.053 4.054 2.844 × 10^0 30.0 MeV 8.509 × 10^1 3.147 3.147 5.684 × 10^0 40.0 MeV 1.003 × 10^2 2.688 2.688 9.145 × 10^0 80.0 MeV 1.527 × 10^2 2.005 2.005 2.692 × 10^1 100. MeV 1.764 × 10^2 1.879 1.879 3.725 × 10^1 140. MeV 2.218 × 10^2 1.751 1.751 5.940 × 10^1 200. MeV 2.868 × 10^2 1.677 1.678 9.455 × 10^1 300. MeV 3.917 × 10^2 1.650 0.000 1.650 1.548 × 10^2 313. MeV 4.055 × 10^2 1.650 0.000 1.650 Minimum ionization 400. MeV 4.945 × 10^2 1.656 0.000 1.656 2.154 × 10^2 800. MeV 8.995 × 10^2 1.719 0.000 0.000 1.720 4.524 × 10^2 1.00 GeV 1.101 × 10^3 1.748 0.000 0.000 1.749 5.677 × 10^2 1.40 GeV 1.502 × 10^3 1.794 0.000 0.001 1.796 7.933 × 10^2 2.00 GeV 2.103 × 10^3 1.845 0.000 0.000 0.001 1.847 1.123 × 10^3 3.00 GeV 3.104 × 10^3 1.903 0.001 0.000 0.001 1.906 1.655 × 10^3 4.00 GeV 4.104 × 10^3 1.943 0.001 0.001 0.002 1.947 2.174 × 10^3 8.00 GeV 8.105 × 10^3 2.034 0.003 0.002 0.004 2.043 4.174 × 10^3 10.0 GeV 1.011 × 10^4 2.061 0.003 0.003 0.005 2.073 5.145 × 10^3 14.0 GeV 1.411 × 10^4 2.102 0.005 0.005 0.007 2.119 7.053 × 10^3 20.0 GeV 2.011 × 10^4 2.143 0.008 0.009 0.009 2.169 9.849 × 10^3 30.0 GeV 3.011 × 10^4 2.188 0.013 0.016 0.014 2.231 1.439 × 10^4 40.0 GeV 4.011 × 10^4 2.219 0.018 0.023 0.018 2.278 1.883 × 10^4 80.0 GeV 8.011 × 10^4 2.290 0.042 0.057 0.034 2.424 3.582 × 10^4 100. GeV 1.001 × 10^5 2.312 0.055 0.075 0.043 2.485 4.397 × 10^4 140. GeV 1.401 × 10^5 2.345 0.081 0.113 0.059 2.598 5.970 × 10^4 200. GeV 2.001 × 10^5 2.379 0.122 0.173 0.084 2.759 8.211 × 10^4 300. GeV 3.001 × 10^5 2.418 0.193 0.275 0.126 3.013 1.168 × 10^5 400. GeV 4.001 × 10^5 2.446 0.267 0.382 0.168 3.263 1.487 × 10^5 800. GeV 8.001 × 10^5 2.513 0.574 0.828 0.339 4.254 2.557 × 10^5 1.00 TeV 1.000 × 10^6 2.535 0.732 1.059 0.426 4.753 3.002 × 10^5 1.14 TeV 1.139 × 10^6 2.548 0.843 1.218 0.488 5.097 Muon critical energy 1.40 TeV 1.400 × 10^6 2.569 1.053 1.519 0.604 5.744 3.766 × 10^5 2.00 TeV 2.000 × 10^6 2.605 1.545 2.224 0.875 7.248 4.694 × 10^5 3.00 TeV 3.000 × 10^6 2.646 2.370 3.399 1.341 9.756 5.879 × 10^5 4.00 TeV 4.000 × 10^6 2.675 3.210 4.591 1.815 12.292 6.791 × 10^5 8.00 TeV 8.000 × 10^6 2.748 6.613 9.395 3.790 22.547 9.158 × 10^5 10.0 TeV 1.000 × 10^7 2.772 8.335 11.816 4.807 27.730 9.957 × 10^5 14.0 TeV 1.400 × 10^7 2.809 11.771 16.638 6.903 38.121 1.118 × 10^6 20.0 TeV 2.000 × 10^7 2.849 16.969 23.914 10.123 53.854 1.250 × 10^6 30.0 TeV 3.000 × 10^7 2.894 25.624 36.017 15.715 80.251 1.401 × 10^6 40.0 TeV 4.000 × 10^7 2.927 34.327 48.161 21.456 106.871 1.509 × 10^6 80.0 TeV 8.000 × 10^7 3.008 69.204 96.783 45.552 214.548 1.768 × 10^6 100. TeV 1.000 × 10^8 3.035 86.682 121.126 58.045 268.889 1.851 × 10^6