Muons in bohrium (Bh)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 107 (Bh) [270.133 (4)] ?? 1087.0 0.27391 3.0000 0.6345 3.0000 6.5475 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.559 3.559 1.669 × 10^0 14.0 MeV 5.616 × 10^1 2.869 2.869 2.931 × 10^0 20.0 MeV 6.802 × 10^1 2.305 2.305 5.287 × 10^0 30.0 MeV 8.509 × 10^1 1.836 1.836 1.021 × 10^1 40.0 MeV 1.003 × 10^2 1.593 1.593 1.609 × 10^1 80.0 MeV 1.527 × 10^2 1.237 1.237 4.540 × 10^1 100. MeV 1.764 × 10^2 1.175 1.175 6.203 × 10^1 140. MeV 2.218 × 10^2 1.118 1.119 9.707 × 10^1 200. MeV 2.868 × 10^2 1.098 0.000 1.098 1.514 × 10^2 207. MeV 2.943 × 10^2 1.097 0.000 1.098 Minimum ionization 300. MeV 3.917 × 10^2 1.112 0.000 0.000 1.112 2.421 × 10^2 400. MeV 4.945 × 10^2 1.139 0.000 0.000 1.140 3.309 × 10^2 800. MeV 8.995 × 10^2 1.238 0.001 0.000 1.240 6.664 × 10^2 1.00 GeV 1.101 × 10^3 1.274 0.002 0.000 1.277 8.253 × 10^2 1.40 GeV 1.502 × 10^3 1.330 0.003 0.000 1.334 1.131 × 10^3 2.00 GeV 2.103 × 10^3 1.389 0.005 0.000 0.001 1.396 1.571 × 10^3 3.00 GeV 3.104 × 10^3 1.454 0.009 0.003 0.001 1.468 2.268 × 10^3 4.00 GeV 4.104 × 10^3 1.498 0.013 0.007 0.001 1.520 2.937 × 10^3 8.00 GeV 8.105 × 10^3 1.595 0.033 0.025 0.003 1.657 5.447 × 10^3 10.0 GeV 1.011 × 10^4 1.624 0.044 0.037 0.004 1.709 6.635 × 10^3 14.0 GeV 1.411 × 10^4 1.664 0.067 0.061 0.005 1.798 8.915 × 10^3 20.0 GeV 2.011 × 10^4 1.704 0.104 0.101 0.007 1.917 1.214 × 10^4 30.0 GeV 3.011 × 10^4 1.745 0.171 0.181 0.010 2.108 1.712 × 10^4 40.0 GeV 4.011 × 10^4 1.773 0.241 0.268 0.014 2.298 2.166 × 10^4 80.0 GeV 8.011 × 10^4 1.834 0.546 0.656 0.027 3.065 3.669 × 10^4 100. GeV 1.001 × 10^5 1.852 0.708 0.867 0.034 3.462 4.283 × 10^4 113. GeV 1.135 × 10^5 1.863 0.817 1.008 0.038 3.727 Muon critical energy 140. GeV 1.401 × 10^5 1.880 1.038 1.299 0.047 4.266 5.322 × 10^4 200. GeV 2.001 × 10^5 1.909 1.556 1.985 0.067 5.518 6.557 × 10^4 300. GeV 3.001 × 10^5 1.942 2.438 3.129 0.100 7.611 8.095 × 10^4 400. GeV 4.001 × 10^5 1.965 3.349 4.316 0.134 9.766 9.252 × 10^4 800. GeV 8.001 × 10^5 2.022 7.105 9.182 0.270 18.581 1.217 × 10^5 1.00 TeV 1.000 × 10^6 2.040 9.032 11.672 0.339 23.086 1.314 × 10^5 1.40 TeV 1.400 × 10^6 2.068 12.891 16.635 0.480 32.076 1.460 × 10^5 2.00 TeV 2.000 × 10^6 2.098 18.787 24.209 0.694 45.792 1.616 × 10^5 3.00 TeV 3.000 × 10^6 2.133 28.623 36.793 1.061 68.612 1.793 × 10^5 4.00 TeV 4.000 × 10^6 2.158 38.581 49.509 1.433 91.684 1.919 × 10^5 8.00 TeV 8.000 × 10^6 2.220 78.696 100.619 2.974 184.510 2.220 × 10^5 10.0 TeV 1.000 × 10^7 2.240 98.895 126.306 3.764 231.207 2.317 × 10^5 14.0 TeV 1.400 × 10^7 2.271 139.183 177.563 5.385 324.404 2.462 × 10^5 20.0 TeV 2.000 × 10^7 2.304 199.938 254.774 7.868 464.886 2.616 × 10^5 30.0 TeV 3.000 × 10^7 2.342 301.179 383.215 12.155 698.894 2.790 × 10^5 40.0 TeV 4.000 × 10^7 2.370 402.775 511.951 16.541 933.639 2.914 × 10^5 80.0 TeV 8.000 × 10^7 2.438 809.119 1027.254 34.837 1873.651 3.210 × 10^5 100. TeV 1.000 × 10^8 2.461 1012.410 1285.140 44.280 2344.293 3.305 × 10^5