b(E) × 10^6 [cm^2g^{−1}] for lithium amide (LiNH_2)

⟨Z/A⟩ = 0.52257

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2131 0.0914 0.4799 0.7844 5. 0.2895 0.2281 0.5064 1.0240 10. 0.3534 0.3492 0.4904 1.1930 20. 0.4212 0.4814 0.4671 1.3699 50. 0.5144 0.6670 0.4419 1.6233 100. 0.5844 0.7998 0.4296 1.8139 200. 0.6515 0.9212 0.4234 1.9961 500. 0.7311 1.0491 0.4223 2.2026 1000. 0.7826 1.1283 0.4293 2.3402 2000. 0.8257 1.1848 0.4409 2.4514 5000. 0.8691 1.2352 0.4627 2.5670 10000. 0.8924 1.2591 0.4847 2.6362 20000. 0.9090 1.2741 0.5106 2.6938 50000. 0.9234 1.2858 0.5514 2.7606 100000. 0.9303 1.2906 0.5864 2.8073