b(E) × 10^6 [cm^2g^{−1}] for lead tungstate (PbWO_4)

⟨Z/A⟩ = 0.41315

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.6596 0.3990 0.3781 2.4368 5. 2.2998 1.6801 0.4032 4.3831 10. 2.8223 2.6764 0.3947 5.8935 20. 3.3588 3.6078 0.3782 7.3448 50. 4.0614 5.0222 0.3638 9.4474 100. 4.5615 5.9583 0.3561 10.8758 200. 5.0184 6.7894 0.3523 12.1600 500. 5.5317 7.5532 0.3524 13.4373 1000. 5.8413 7.9598 0.3579 14.1590 2000. 6.0825 8.2525 0.3666 14.7017 5000. 6.3067 8.4977 0.3827 15.1870 10000. 6.4178 8.6110 0.3987 15.4275 20000. 6.4915 8.6847 0.4174 15.5936 50000. 6.5526 8.7399 0.4464 15.7389 100000. 6.5797 8.7628 0.4713 15.8139