b(E) × 10^6 [cm^2g^{−1}] for calcium sulfate (CaSO_4)

⟨Z/A⟩ = 0.49950

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4925 0.2279 0.4427 1.1631 5. 0.6691 0.5593 0.4706 1.6990 10. 0.8130 0.8272 0.4582 2.0985 20. 0.9623 1.1115 0.4387 2.5124 50. 1.1612 1.5157 0.4171 3.0941 100. 1.3063 1.7966 0.4066 3.5094 200. 1.4428 2.0510 0.4013 3.8950 500. 1.6014 2.3074 0.4007 4.3094 1000. 1.7010 2.4509 0.4072 4.5592 2000. 1.7819 2.5549 0.4178 4.7547 5000. 1.8606 2.6442 0.4376 4.9424 10000. 1.9014 2.6863 0.4575 5.0452 20000. 1.9301 2.7132 0.4807 5.1240 50000. 1.9532 2.7344 0.5170 5.2046 100000. 1.9642 2.7431 0.5481 5.2555