b(E) × 10^6 [cm^2g^{−1}] for cadmium tungstate (CdWO_4)

⟨Z/A⟩ = 0.42747

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3867 0.4351 0.3891 2.2109 5. 1.9159 1.4889 0.4149 3.8196 10. 2.3473 2.3086 0.4029 5.0588 20. 2.7903 3.0893 0.3864 6.2659 50. 3.3714 4.2639 0.3734 8.0088 100. 3.7861 5.0457 0.3653 9.1970 200. 4.1663 5.7429 0.3613 10.2705 500. 4.5955 6.3877 0.3612 11.3444 1000. 4.8557 6.7332 0.3670 11.9557 2000. 5.0594 6.9825 0.3760 12.4179 5000. 5.2500 7.1919 0.3927 12.8345 10000. 5.3449 7.2889 0.4094 13.0433 20000. 5.4083 7.3521 0.4287 13.1892 50000. 5.4608 7.3997 0.4590 13.3195 100000. 5.4844 7.4193 0.4849 13.3887