) (GeV)

TρM(

160 180 200 220

) (GeV) Tπ M(

60

80

100

120

(b) = 500 GeV VM -1 DØ, 388 pb

production threshold Tπ W production threshold

Tπ _Tπ

Excluded Region (NN)

Excluded Region (Cut-based)