) (GeV)

TρM(

170 180 190 200 210 220 230 240 250

) (GeV) Tπ M(

90 100 110 120 130 140 150 160

production threshold TπW production threshold Tπ_Tπ→ρ

Forbidden Region

)^{-1}

CDF Run II Preliminary (1.9 fb

Expected Excluded Region Excluded Region