)^2

Higgs Boson Mass (GeV/c

100 110 120 130 140 150 160 170 180 190 200

SMσ /σ Best Fit

0 0.5 1 1.5 2 2.5 3 3.5_{-1} 10.0 fb

≤ _{int}L

Tevatron RunII Preliminary

Best Fit 1 s.d. ±

February 2012