1

10

100 110 120 130 140 150 160 170 180 190 200

1

m_H (GeV/c^2)

95% CL Limit/SM

Tevatron Run II Preliminary, L Ω 10.0 fb^{-1}

Expected Observed Α1 s.d. Expected Α2 s.d. Expected

LEP Exclusion

Tevatron +ATLAS+CMS Exclusion

SM=1

Tevatron + LEP Exclusion

CMS Exclusion

ATLAS Exclusion

ATLAS Exclusion

LEP+ATLAS Exclusion

ATLAS+CMS Exclusion

ATLAS+CMS Exclusion

February 27, 2012