10^{-2}

1

10^2

10^4

10^6

10^8

10^9

2 4 6 8 10

WA70 (√s =23 GeV) E706 (√s =31.5 GeV) AFS (√s =63 GeV) R806 (√s =62.8 GeV) PHENIX (√s =62 GeV) PHENIX (√s =200 GeV) UA2 (√s =540 GeV)

Ed^3σ/dp^3 [ pb/GeV^2 ] p_T [ GeV] a) π^0

p_T [ GeV] b) (h^++h^−)/2_{UA1 (√s =200 GeV)}

UA1 (√s =500 GeV) UA1 (√s =900 GeV) CDF (√s =630 GeV) CDF (√s =1800 GeV)

10^4

10^5

10^6

10^7

10^8

10^9

2 4 6 8 10