) (GeV)

TρM(

200 250 300 350 400

) (GeV) Tπ M(

100

150

200

250

300

350

Tπ_Tπ→_Tρ

TπW →_Tρ

Excluded 95% C.L. region Expected 95% C.L. limit threshold

Tπ_Tπ→_Tρ threshold TπW →_Tρ

-1 , 4.1 fb ∅D