Higgs boson mass (GeV)

110 115 120 125 130 135 140 145

SMσ/σ Best fit

-1.0

-0.5 0.0 0.5 1.0 1.5 2.0 2.5 68% CL band

CMS Preliminary = 7 TeV s_{-1} L = 4.6-4.8 fb