Higgs boson mass (GeV)

110 115 120 125 130 135 140 145

Local p-value

-6 10

-5 10

-4 10

-3 10

-2 10

-1 10 σ1 σ2

σ3

σ4 Combined obs. Exp. for SM Higgs )^{-1} bb (4.7 fb →H )^{-1}

(4.6 fb ττ→H )^{-1}

(4.8 fb γγ→H )^{-1}

WW (4.6 fb →H )^{-1}

ZZ (4.7 fb →H

Global significance in range 110-600 GeV σ 0.8 in range 110-145 GeV σ2.1

CMS Preliminary = 7 TeV s_{-1} L = 4.6-4.8 fb