Higgs boson mass (GeV)

100 200 300 400 500 600

SMσ/σ 95% CL limit on

-1 10

1

10 Observed

Expected (68%) Expected (95%)

Observed -1 L = 4.6-4.8 fb

= 7 TeV s CMS Preliminary,