[GeV] +Hm 90 100 110 120 130 140 150 160

+ bH →t B

-2 10

-1 10

1 Observed CLs Expected σ 1± σ 2±

ATLAS

Data 2011

= 7 TeV s -1 Ldt = 4.6 fb ∫ combined