[GeV] W’ m 500 1000 1500 2000 2500

B [pb] σ

-3 10

-2 10

-1 10

1_{NNLO theory}

Observed limit Expected limit σ 1± Expected σ 2± Expected

= 7 TeV,

s ∫^{-1}

= 7 TeV, Ldt = 1.04 fb s ν e → W’ ATLAS