[GeV] Hm 110 115 120 125 130 135 140 145 150

Signal strength

-1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 Best fit ) < 1 μ(λ -2 ln = 7 TeV s -1 Ldt = 4.6-4.9 fb ∫ ATLASPreliminary 2011 Data