[GeV] Hm 100 200 300 400 500 600

SMσ/σ 95% CL Limit on

-1 10

1

10 Obs. Exp. σ1± σ2± = 7 TeV s -1 Ldt = 4.6-4.9 fb ∫ ATLASPreliminary 2011 Data

CLs Limits