)θ(2^2sin

0.80 0.85 0.90 0.95 1.00

)^2 eV -3 | (10

2mΔ|

1.5

2.0

2.5

3.0

3.5^{-3}10×

MINOS best fit MINOS 2008 90% MINOS 90% Super-K 90% MINOS 68% Super-K L/E 90%