resonance mass [GeV]

400 600 800 1000 1200

B [pb] σ

-2 10

-1 10

1 -1 DØ, 5.3 fb

X =0.03M XΓ Z’ X =0.012M XΓ Z’ Coloron r=0.2 Coloron r=0.1 95% C.L. observed 95% C.L. expected