0 200 400 600 800 1000

Ma s s s ca le s [GeV]

g̃ → tt̄χ̃^0_1 g̃ → qq̄(χ̃^0_2 → Zχ̃^0 ) g̃ → qq̄(χ̃^0_2 → llχ̃^0 )|χ̃^0 g̃ → qq̄(χ̃^± → l^± νχ̃^0 ) g̃ → bb̄χ̃^0 q̃ → qχ̃^0 g̃ → qq̄χ̃^0

1 .1 fb^{− 1} , g lu in o

0 .9 8 - 2 .1 fb^{− 1} , g lu in o

0 .9 8 fb^{− 1} , g lu in o

0 .9 8 fb^{− 1} , g lu in o

1 .1 fb^{− 1} , g lu in o

1 .1 fb^{− 1} , s q u a rk

1 .1 fb^{− 1} , g lu in o

Lim its , m(χ̃^0 )= 0 Ge V

Lim its , m(mother)− m(χ̃^0 ) = 200 Ge V

CMS Preliminary