Table 262: b(E) × 10^6 [cm^2g^{−1}] for Soft tissue (ICRU four-component) ⟨Z/A⟩ = 0.54975

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2836 0.1246 0.4700 0.8782 5. 0.3847 0.3078 0.4975 1.1901 10. 0.4684 0.4650 0.4826 1.4160 20. 0.5566 0.6360 0.4603 1.6529 50. 0.6765 0.8768 0.4359 1.9893 100. 0.7656 1.0469 0.4241 2.2366 200. 0.8508 1.2036 0.4179 2.4724 500. 0.9513 1.3645 0.4170 2.7328 1000. 1.0157 1.4630 0.4237 2.9024 2000. 1.0692 1.5323 0.4350 3.0364 5000. 1.1226 1.5933 0.4562 3.1722 10000. 1.1511 1.6221 0.4777 3.2510 20000. 1.1713 1.6403 0.5029 3.3145 50000. 1.1886 1.6547 0.5424 3.3857 100000. 1.1969 1.6606 0.5764 3.4339