Table 229: Muons in Polyvinylacetate [CH_2CHOCOCH_3]_n

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53432 1.190 73.7 0.11442 3.3762 0.1769 2.6747 3.3309 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.684 7.684 7.191 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.993 5.994 1.315 × 10^0 20.0 MeV 6.802 × 10^1 4.680 4.680 2.461 × 10^0 30.0 MeV 8.509 × 10^1 3.631 3.631 4.921 × 10^0 40.0 MeV 1.003 × 10^2 3.100 3.100 7.921 × 10^0 80.0 MeV 1.527 × 10^2 2.327 2.327 2.329 × 10^1 100. MeV 1.764 × 10^2 2.182 2.182 3.218 × 10^1 140. MeV 2.218 × 10^2 2.032 2.032 5.127 × 10^1 200. MeV 2.868 × 10^2 1.945 1.945 8.157 × 10^1 300. MeV 3.917 × 10^2 1.912 0.000 1.912 1.336 × 10^2 318. MeV 4.105 × 10^2 1.911 0.000 1.912 Minimum ionization 400. MeV 4.945 × 10^2 1.918 0.000 1.918 1.858 × 10^2 800. MeV 8.995 × 10^2 1.990 0.000 0.000 1.990 3.906 × 10^2 1.00 GeV 1.101 × 10^3 2.023 0.000 0.000 2.023 4.903 × 10^2 1.40 GeV 1.502 × 10^3 2.076 0.000 0.001 2.077 6.853 × 10^2 2.00 GeV 2.103 × 10^3 2.135 0.001 0.000 0.001 2.137 9.698 × 10^2 3.00 GeV 3.104 × 10^3 2.203 0.001 0.001 0.001 2.206 1.430 × 10^3 4.00 GeV 4.104 × 10^3 2.249 0.001 0.001 0.002 2.254 1.878 × 10^3 8.00 GeV 8.105 × 10^3 2.357 0.003 0.003 0.004 2.367 3.605 × 10^3 10.0 GeV 1.011 × 10^4 2.389 0.004 0.004 0.005 2.403 4.443 × 10^3 14.0 GeV 1.411 × 10^4 2.436 0.007 0.007 0.007 2.457 6.089 × 10^3 20.0 GeV 2.011 × 10^4 2.484 0.010 0.012 0.009 2.515 8.501 × 10^3 30.0 GeV 3.011 × 10^4 2.535 0.017 0.020 0.014 2.586 1.242 × 10^4 40.0 GeV 4.011 × 10^4 2.570 0.024 0.030 0.018 2.642 1.624 × 10^4 80.0 GeV 8.011 × 10^4 2.651 0.054 0.073 0.034 2.812 3.089 × 10^4 100. GeV 1.001 × 10^5 2.676 0.070 0.096 0.043 2.885 3.791 × 10^4 140. GeV 1.401 × 10^5 2.714 0.104 0.144 0.059 3.020 5.146 × 10^4 200. GeV 2.001 × 10^5 2.753 0.156 0.221 0.084 3.213 7.071 × 10^4 300. GeV 3.001 × 10^5 2.797 0.246 0.351 0.126 3.520 1.004 × 10^5 400. GeV 4.001 × 10^5 2.829 0.340 0.486 0.167 3.822 1.277 × 10^5 800. GeV 8.001 × 10^5 2.905 0.730 1.051 0.338 5.025 2.187 × 10^5 1.00 TeV 1.000 × 10^6 2.930 0.932 1.344 0.425 5.631 2.562 × 10^5 1.08 TeV 1.083 × 10^6 2.939 1.015 1.462 0.461 5.878 Muon critical energy 1.40 TeV 1.400 × 10^6 2.968 1.339 1.925 0.603 6.834 3.206 × 10^5 2.00 TeV 2.000 × 10^6 3.008 1.964 2.816 0.873 8.661 3.985 × 10^5 3.00 TeV 3.000 × 10^6 3.055 3.011 4.301 1.337 11.705 4.974 × 10^5 4.00 TeV 4.000 × 10^6 3.089 4.078 5.806 1.810 14.783 5.733 × 10^5 8.00 TeV 8.000 × 10^6 3.172 8.396 11.870 3.778 27.216 7.697 × 10^5 10.0 TeV 1.000 × 10^7 3.199 10.580 14.924 4.792 33.496 8.359 × 10^5 14.0 TeV 1.400 × 10^7 3.241 14.938 21.010 6.882 46.072 9.373 × 10^5 20.0 TeV 2.000 × 10^7 3.285 21.533 30.190 10.093 65.101 1.046 × 10^6 30.0 TeV 3.000 × 10^7 3.337 32.513 45.464 15.667 96.981 1.171 × 10^6 40.0 TeV 4.000 × 10^7 3.375 43.554 60.787 21.388 129.104 1.260 × 10^6 80.0 TeV 8.000 × 10^7 3.467 87.817 122.134 45.404 258.822 1.475 × 10^6 100. TeV 1.000 × 10^8 3.497 110.006 152.844 57.854 324.202 1.544 × 10^6