Table 214: Muons in n-pentane (C_5H_{12})

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.58212 0.626 53.6 0.10809 3.5265 0.2086 2.5855 3.2504 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.716 8.716 6.322 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.788 6.788 1.158 × 10^0 20.0 MeV 6.802 × 10^1 5.293 5.293 2.170 × 10^0 30.0 MeV 8.509 × 10^1 4.100 4.100 4.347 × 10^0 40.0 MeV 1.003 × 10^2 3.498 3.498 7.005 × 10^0 80.0 MeV 1.527 × 10^2 2.620 2.620 2.064 × 10^1 100. MeV 1.764 × 10^2 2.460 2.460 2.854 × 10^1 140. MeV 2.218 × 10^2 2.289 2.289 4.548 × 10^1 200. MeV 2.868 × 10^2 2.189 2.189 7.239 × 10^1 300. MeV 3.917 × 10^2 2.149 0.000 2.149 1.186 × 10^2 328. MeV 4.211 × 10^2 2.148 0.000 2.148 Minimum ionization 400. MeV 4.945 × 10^2 2.153 0.000 2.153 1.652 × 10^2 800. MeV 8.995 × 10^2 2.228 0.000 0.000 2.229 3.478 × 10^2 1.00 GeV 1.101 × 10^3 2.263 0.000 0.000 2.264 4.369 × 10^2 1.40 GeV 1.502 × 10^3 2.320 0.000 0.001 2.321 6.113 × 10^2 2.00 GeV 2.103 × 10^3 2.383 0.000 0.000 0.001 2.385 8.661 × 10^2 3.00 GeV 3.104 × 10^3 2.455 0.001 0.000 0.001 2.457 1.279 × 10^3 4.00 GeV 4.104 × 10^3 2.504 0.001 0.001 0.002 2.508 1.681 × 10^3 8.00 GeV 8.105 × 10^3 2.619 0.003 0.003 0.004 2.628 3.235 × 10^3 10.0 GeV 1.011 × 10^4 2.654 0.004 0.004 0.005 2.666 3.990 × 10^3 14.0 GeV 1.411 × 10^4 2.705 0.006 0.006 0.007 2.723 5.473 × 10^3 20.0 GeV 2.011 × 10^4 2.756 0.009 0.010 0.009 2.784 7.651 × 10^3 30.0 GeV 3.011 × 10^4 2.812 0.014 0.017 0.014 2.858 1.119 × 10^4 40.0 GeV 4.011 × 10^4 2.850 0.020 0.026 0.018 2.914 1.466 × 10^4 80.0 GeV 8.011 × 10^4 2.938 0.047 0.063 0.035 3.082 2.798 × 10^4 100. GeV 1.001 × 10^5 2.965 0.061 0.083 0.043 3.152 3.440 × 10^4 140. GeV 1.401 × 10^5 3.006 0.090 0.124 0.060 3.280 4.683 × 10^4 200. GeV 2.001 × 10^5 3.049 0.135 0.191 0.085 3.460 6.463 × 10^4 300. GeV 3.001 × 10^5 3.097 0.214 0.304 0.128 3.743 9.241 × 10^4 400. GeV 4.001 × 10^5 3.131 0.296 0.422 0.170 4.020 1.182 × 10^5 800. GeV 8.001 × 10^5 3.215 0.638 0.916 0.343 5.112 2.062 × 10^5 1.00 TeV 1.000 × 10^6 3.242 0.814 1.171 0.431 5.659 2.434 × 10^5 1.33 TeV 1.329 × 10^6 3.277 1.107 1.589 0.580 6.553 Muon critical energy 1.40 TeV 1.400 × 10^6 3.283 1.171 1.680 0.612 6.747 3.080 × 10^5 2.00 TeV 2.000 × 10^6 3.327 1.720 2.462 0.886 8.396 3.876 × 10^5 3.00 TeV 3.000 × 10^6 3.378 2.642 3.762 1.359 11.141 4.907 × 10^5 4.00 TeV 4.000 × 10^6 3.415 3.581 5.083 1.839 13.918 5.708 × 10^5 8.00 TeV 8.000 × 10^6 3.505 7.388 10.405 3.841 25.139 7.817 × 10^5 10.0 TeV 1.000 × 10^7 3.535 9.316 13.086 4.873 30.811 8.534 × 10^5 14.0 TeV 1.400 × 10^7 3.580 13.165 18.428 7.000 42.174 9.640 × 10^5 20.0 TeV 2.000 × 10^7 3.629 18.993 26.487 10.270 59.380 1.083 × 10^6 30.0 TeV 3.000 × 10^7 3.686 28.699 39.893 15.951 88.230 1.221 × 10^6 40.0 TeV 4.000 × 10^7 3.726 38.464 53.345 21.784 117.320 1.319 × 10^6 80.0 TeV 8.000 × 10^7 3.827 77.618 107.201 46.292 234.937 1.555 × 10^6 100. TeV 1.000 × 10^8 3.860 97.249 134.162 59.006 294.276 1.631 × 10^6