Table 110: Muons in Anthracene (C_{14}H_{10})

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.52740 1.283 69.5 0.14677 3.2831 0.1146 2.5213 3.1514 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.642 7.642 7.227 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.959 5.959 1.322 × 10^0 20.0 MeV 6.802 × 10^1 4.652 4.652 2.474 × 10^0 30.0 MeV 8.509 × 10^1 3.608 3.608 4.950 × 10^0 40.0 MeV 1.003 × 10^2 3.080 3.080 7.969 × 10^0 80.0 MeV 1.527 × 10^2 2.305 2.305 2.345 × 10^1 100. MeV 1.764 × 10^2 2.159 2.159 3.244 × 10^1 140. MeV 2.218 × 10^2 2.010 2.010 5.173 × 10^1 200. MeV 2.868 × 10^2 1.923 1.924 8.237 × 10^1 300. MeV 3.917 × 10^2 1.890 0.000 1.890 1.350 × 10^2 318. MeV 4.105 × 10^2 1.889 0.000 1.890 Minimum ionization 400. MeV 4.945 × 10^2 1.895 0.000 1.895 1.878 × 10^2 800. MeV 8.995 × 10^2 1.965 0.000 0.000 1.966 3.952 × 10^2 1.00 GeV 1.101 × 10^3 1.997 0.000 0.000 1.998 4.961 × 10^2 1.40 GeV 1.502 × 10^3 2.049 0.000 0.001 2.050 6.936 × 10^2 2.00 GeV 2.103 × 10^3 2.107 0.000 0.000 0.001 2.109 9.819 × 10^2 3.00 GeV 3.104 × 10^3 2.173 0.001 0.001 0.001 2.175 1.448 × 10^3 4.00 GeV 4.104 × 10^3 2.218 0.001 0.001 0.002 2.222 1.903 × 10^3 8.00 GeV 8.105 × 10^3 2.322 0.003 0.003 0.004 2.332 3.655 × 10^3 10.0 GeV 1.011 × 10^4 2.354 0.004 0.004 0.005 2.367 4.506 × 10^3 14.0 GeV 1.411 × 10^4 2.400 0.006 0.006 0.007 2.419 6.176 × 10^3 20.0 GeV 2.011 × 10^4 2.447 0.009 0.011 0.009 2.476 8.626 × 10^3 30.0 GeV 3.011 × 10^4 2.498 0.015 0.018 0.014 2.545 1.261 × 10^4 40.0 GeV 4.011 × 10^4 2.532 0.022 0.027 0.018 2.599 1.649 × 10^4 80.0 GeV 8.011 × 10^4 2.612 0.049 0.066 0.034 2.761 3.140 × 10^4 100. GeV 1.001 × 10^5 2.636 0.064 0.087 0.043 2.830 3.855 × 10^4 140. GeV 1.401 × 10^5 2.673 0.094 0.131 0.059 2.958 5.237 × 10^4 200. GeV 2.001 × 10^5 2.712 0.142 0.201 0.084 3.139 7.206 × 10^4 300. GeV 3.001 × 10^5 2.756 0.224 0.319 0.126 3.426 1.025 × 10^5 400. GeV 4.001 × 10^5 2.787 0.310 0.443 0.168 3.708 1.306 × 10^5 800. GeV 8.001 × 10^5 2.862 0.666 0.959 0.340 4.827 2.248 × 10^5 1.00 TeV 1.000 × 10^6 2.887 0.851 1.226 0.427 5.390 2.640 × 10^5 1.15 TeV 1.149 × 10^6 2.902 0.987 1.422 0.493 5.805 Muon critical energy 1.40 TeV 1.400 × 10^6 2.924 1.222 1.758 0.605 6.509 3.315 × 10^5 2.00 TeV 2.000 × 10^6 2.964 1.793 2.573 0.876 8.207 4.134 × 10^5 3.00 TeV 3.000 × 10^6 3.011 2.751 3.930 1.343 11.035 5.181 × 10^5 4.00 TeV 4.000 × 10^6 3.044 3.725 5.308 1.818 13.895 5.987 × 10^5 8.00 TeV 8.000 × 10^6 3.126 7.675 10.857 3.796 25.454 8.083 × 10^5 10.0 TeV 1.000 × 10^7 3.153 9.673 13.653 4.815 31.294 8.790 × 10^5 14.0 TeV 1.400 × 10^7 3.194 13.661 19.223 6.915 42.993 9.877 × 10^5 20.0 TeV 2.000 × 10^7 3.238 19.695 27.626 10.142 60.701 1.105 × 10^6 30.0 TeV 3.000 × 10^7 3.289 29.742 41.606 15.745 90.382 1.239 × 10^6 40.0 TeV 4.000 × 10^7 3.326 39.846 55.632 21.497 120.300 1.334 × 10^6 80.0 TeV 8.000 × 10^7 3.417 80.336 111.787 45.645 241.186 1.565 × 10^6 100. TeV 1.000 × 10^8 3.447 100.629 139.899 58.167 302.142 1.639 × 10^6