Table 268: Muons in Triethyl phosphate C_6H_{15}PO_4

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53800 1.070 81.2 0.06922 3.6302 0.2054 2.9428 3.6242 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.640 7.640 7.239 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.962 5.962 1.323 × 10^0 20.0 MeV 6.802 × 10^1 4.658 4.658 2.474 × 10^0 30.0 MeV 8.509 × 10^1 3.615 3.615 4.946 × 10^0 40.0 MeV 1.003 × 10^2 3.088 3.088 7.958 × 10^0 80.0 MeV 1.527 × 10^2 2.319 2.320 2.338 × 10^1 100. MeV 1.764 × 10^2 2.180 2.180 3.229 × 10^1 140. MeV 2.218 × 10^2 2.032 2.033 5.139 × 10^1 200. MeV 2.868 × 10^2 1.948 1.949 8.165 × 10^1 300. MeV 3.917 × 10^2 1.918 0.000 1.918 1.335 × 10^2 314. MeV 4.065 × 10^2 1.917 0.000 1.918 Minimum ionization 400. MeV 4.945 × 10^2 1.925 0.000 1.925 1.856 × 10^2 800. MeV 8.995 × 10^2 2.001 0.000 0.000 2.002 3.894 × 10^2 1.00 GeV 1.101 × 10^3 2.035 0.000 0.000 2.036 4.885 × 10^2 1.40 GeV 1.502 × 10^3 2.090 0.000 0.000 0.001 2.092 6.822 × 10^2 2.00 GeV 2.103 × 10^3 2.151 0.001 0.000 0.001 2.153 9.647 × 10^2 3.00 GeV 3.104 × 10^3 2.220 0.001 0.001 0.001 2.224 1.421 × 10^3 4.00 GeV 4.104 × 10^3 2.268 0.002 0.001 0.002 2.273 1.866 × 10^3 8.00 GeV 8.105 × 10^3 2.378 0.004 0.004 0.004 2.390 3.576 × 10^3 10.0 GeV 1.011 × 10^4 2.412 0.005 0.005 0.005 2.427 4.407 × 10^3 14.0 GeV 1.411 × 10^4 2.460 0.008 0.008 0.007 2.482 6.035 × 10^3 20.0 GeV 2.011 × 10^4 2.508 0.012 0.014 0.009 2.543 8.422 × 10^3 30.0 GeV 3.011 × 10^4 2.561 0.020 0.024 0.013 2.618 1.229 × 10^4 40.0 GeV 4.011 × 10^4 2.596 0.028 0.035 0.018 2.677 1.607 × 10^4 80.0 GeV 8.011 × 10^4 2.677 0.063 0.085 0.034 2.860 3.050 × 10^4 100. GeV 1.001 × 10^5 2.703 0.082 0.113 0.042 2.940 3.740 × 10^4 140. GeV 1.401 × 10^5 2.740 0.121 0.169 0.059 3.089 5.066 × 10^4 200. GeV 2.001 × 10^5 2.780 0.182 0.258 0.083 3.304 6.944 × 10^4 300. GeV 3.001 × 10^5 2.825 0.288 0.410 0.125 3.647 9.823 × 10^4 400. GeV 4.001 × 10^5 2.856 0.397 0.568 0.166 3.988 1.244 × 10^5 800. GeV 8.001 × 10^5 2.933 0.851 1.226 0.336 5.346 2.108 × 10^5 964. GeV 9.645 × 10^5 2.954 1.044 1.504 0.406 5.909 Muon critical energy 1.00 TeV 1.000 × 10^6 2.958 1.086 1.565 0.422 6.031 2.460 × 10^5 1.40 TeV 1.400 × 10^6 2.996 1.558 2.240 0.598 7.394 3.058 × 10^5 2.00 TeV 2.000 × 10^6 3.037 2.284 3.275 0.866 9.463 3.773 × 10^5 3.00 TeV 3.000 × 10^6 3.084 3.500 4.998 1.327 12.910 4.675 × 10^5 4.00 TeV 4.000 × 10^6 3.118 4.737 6.744 1.796 16.396 5.361 × 10^5 8.00 TeV 8.000 × 10^6 3.202 9.744 13.775 3.748 30.469 7.123 × 10^5 10.0 TeV 1.000 × 10^7 3.229 12.275 17.316 4.754 37.574 7.713 × 10^5 14.0 TeV 1.400 × 10^7 3.271 17.328 24.371 6.825 51.796 8.616 × 10^5 20.0 TeV 2.000 × 10^7 3.316 24.970 35.012 10.008 73.306 9.585 × 10^5 30.0 TeV 3.000 × 10^7 3.368 37.690 52.718 15.532 109.308 1.069 × 10^6 40.0 TeV 4.000 × 10^7 3.406 50.476 70.479 21.201 145.563 1.149 × 10^6 80.0 TeV 8.000 × 10^7 3.499 101.746 141.586 44.990 291.820 1.339 × 10^6 100. TeV 1.000 × 10^8 3.529 127.448 177.180 57.320 365.478 1.400 × 10^6